\documentclass[presentation]{beamer}
% Replacing 'presentation' with 'handout' in the above line
% will produce 4 slides per page.
% The hyperref option makes it possible to include hyperlinks.

\mode<presentation> {
    \usetheme{Boadilla}
    \setbeamercovered{transparent}
}

\usepackage[english]{babel}
\usepackage[latin1]{inputenc}
\usepackage{times}
\usepackage[T1]{fontenc}
%\usepackage{wrapfig}
\usepackage{amsmath}

\mode<handout>{
    \usepackage{pgfpages}
    \pgfpagesuselayout{4 on 1}[letterpaper,landscape,border shrink=5mm]
\setbeamercolor{background canvas}{bg=black!10} }

\setbeamertemplate{footline}
{
    \leavevmode%
    \hbox{%
        \begin{beamercolorbox}[wd=.333333\paperwidth,ht=2.25ex,dp=1ex,center]{author
            in head/foot}%
            \usebeamerfont{author in head/ foot}\insertshortauthor%&\approx& (\insertshorti
        \end{beamercolorbox}%
        \begin{beamercolorbox}[wd=.333333\paperwidth,ht=2.25ex,dp=1ex,center]{title
            in head/foot}%
            \usebeamerfont{title in head/foot}\insertshorttitle
        \end{beamercolorbox}%
        \begin{beamercolorbox}[wd=.333333\paperwidth,ht=2.25ex,dp=1ex,right]{date in
            head/foot}%
            \usebeamerfont{date in head/foot}\insertshortdate\hspace*{2em}
            \insertframenumber / \inserttotalframenumber\hspace*{2ex}
    \end{beamercolorbox}}%
    \vskip0pt%
}

%gets rid of bottom navigation bars
%\setbeamertemplate{footline}[frame number]{}

%gets rid of bottom navigation symbols
%\setbeamertemplate{navigation symbols}{}

%gets rid of footer
%will override 'frame number' instruction above
%comment out to revert to previous/default definitions
%\setbeamertemplate{footline}{}

\newcommand{\backupbegin}{
    \newcounter{framenumberappendix}
    \setcounter{framenumberappendix}{\value{framenumber}}
}
\newcommand{\backupend}{
    \addtocounter{framenumberappendix}{-\value{framenumber}}
    \addtocounter{framenumber}{\value{framenumberappendix}} 
}
%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%

%\title[GEANT4/EGS5]{GEANT4/EGS5}

\title{Overview: detector technologies}

\author{Sho Uemura}
%\institute{bumming around}
\date[August 20, 2018]

%\titlegraphic{
%\includegraphics[height=0.1\textheight]{SLAC_Logo}\hspace*{4.75cm}~
%\includegraphics[height=0.1\textheight]{partner_logo_v2}
%}

\begin{document}

%\setcounter{framenumber}{2} 
\begin{frame}
    \titlepage
\end{frame}

%what have we done?
%what are we working on?
%what are other people doing?
%what could we do?

%silicon, MAPS
%FVTX: lots but a long time ago
%ALPIDE characterization
%MVTX simulation and performance
%MVTX integration
%%design/simulation
%%integration
%%assembly?
%%fabrication/development?
%%characterization?

%WLS/scintillating fiber/SiPM
%dark photon: SiPM characterization
%electronics: dark photon (discrete electronics), LHCb (ASIC)
%integration: fiber connectors, assembly techniques
%%SiPM ASICs (PACIFIC, MuTrig)
%%dark photon, LHCb

%electronics
%%GBT
%%FELIX
%%rad-tolerant frontend
%%trigger

%cryo target
%GEMs

%That that people is thinking on what to say or present during the retreat, I would reemphasize the scope of the meeting and organization. The main goals is organize ourselves. The 15 minutes (sharp, no extra time) team effort presentations are dedicated to describe our current commitments. My introduction will include the physics and overview, the 15 minutes talks should clearly list what should we deliver, when we should deliver, what are the challenges and effort needs for final accomplishments. If there is time, the presentation can briefly mention about possible developments for that project once we finish what we promised to our sponsors.

\begin{frame}{How can we use our hardware capabilities?}
    \begin{itemize}
        \item What have we done, what are we working on?
        \item What have we learned how to do?
        \item What are other people doing? What could we do?
            \begin{itemize}
                \item Who can we collaborate with? What could we contribute?
            \end{itemize}
    \end{itemize}
\end{frame}

\begin{frame}{Current effort, silicon pixels: MVTX}
    \begin{columns}
        \column{0.65\textwidth}
        \begin{itemize}
            \item System integration: readout electronics, mechanical integration
            \item Simulation and performance optimization of MVTX+INTT
            \item Sensor characterization for sPHENIX-specific requirements
            \item We won't have done the hard work of designing MVTX from scratch, but integration and commissioning is not trivial
                \begin{itemize}
                    \item We will be intimately familiar with all parts of this state-of-the-art design
                \end{itemize}
        \end{itemize}
        %\begin{center}
        %\includegraphics[width=0.6\textwidth]{st2_done_1000}
        %\end{center}
        \column{0.35\textwidth}
        \includegraphics[width=\textwidth]{alpide_testbeam}

        \includegraphics[width=\textwidth]{alice_ib}
    \end{columns}
\end{frame}

\begin{frame}{Future effort, silicon pixels}
    \begin{columns}
        \column{0.65\textwidth}
        \begin{itemize}
            \item EIC vertex detector is the obvious big target
                \begin{itemize}
                    \item Smaller short-term applications are good (X-ray?)
                \end{itemize}
            \item MAPS development: long cycles, specialized equipment
                \begin{itemize}
                    \item We are probably ``users'' and not ``developers'' for now
                    \item Collaborators: Heidelberg, CERN, Geneva?
                \end{itemize}
            \item Mechanical design and assembly: MechE support essential, assembly requires specialized facilities
                \begin{itemize}
                    \item Collaborators: LBL, Fermilab?
                \end{itemize}
        \end{itemize}
        %\begin{center}
        %\includegraphics[width=0.6\textwidth]{st2_done_1000}
        %\end{center}
        \column{0.35\textwidth}
        \includegraphics[width=\textwidth]{beast_silicon}
    \end{columns}
\end{frame}

\begin{frame}{SiPM-based detectors}
    \begin{columns}
        \column{0.7\textwidth}
        \begin{itemize}
            \item We built the dark photon hodoscopes, we are building the LHCb magnet station
                \begin{itemize}
                    \item SiPM characterization
                    \item Discrete and ASIC frontends
                    \item Fiber connectors and assembly techniques for efficient construction
                \end{itemize}
            \item Other examples: LHCb SciFi, STAR EPD, sPHENIX EMCal and HCal
                \begin{itemize}
                    \item This is becoming a dominant technology for many types of detectors
                    \item Collaborators: Fermilab, Heidelberg?
                \end{itemize}
        \end{itemize}
        \begin{center}
            \includegraphics[width=0.55\textwidth]{lhcb_fiber_polishing}
            \includegraphics[width=0.4\textwidth]{lhcb_fiber_connectors}
        \end{center}
        \column{0.3\textwidth}
        \includegraphics[width=\textwidth]{sipm_radiation}

        \includegraphics[width=\textwidth]{pacific}
    \end{columns}
\end{frame}

\begin{frame}{Readout electronics}
    \begin{columns}
        \column{0.7\textwidth}
        \begin{itemize}
            \item MVTX: RU frontend and FELIX backend
                \begin{itemize}
                    \item Rad-hard GBT link (the new CERN standard)
                    \item Rad-tolerant FPGA design
                    \item High-speed data acquisition (100 Gbps per FELIX, 48 fiber inputs and outputs)
                    \item RCDAQ: lightweight, flexible DAQ software
                \end{itemize}
            \item SeaQuest DAQ and trigger upgrades
                \begin{itemize}
                    \item Efficient general-purpose designs
                \end{itemize}
        \end{itemize}
        \begin{center}
            \includegraphics[width=0.8\textwidth]{bnl-711_V2}
        \end{center}
        \column{0.3\textwidth}

        \includegraphics[width=\textwidth]{ruv2}

        \includegraphics[width=\textwidth]{rcdaq_monitoring}
    \end{columns}
\end{frame}

\begin{frame}{Readout electronics}
    %\begin{columns}
    %\column{0.65\textwidth}
    \begin{itemize}
        \item RCDAQ and FELIX (for high-performance optical readout) or off-the-shelf kits (otherwise) could be the heart of a general-purpose ``DAQ in a box''
            \begin{itemize}
                \item This could be what we offer collaborators
                \item EE support essential
            \end{itemize}
        \item We have put a lot of effort into digging into, understanding, and documenting the systems we have been working with
            \begin{itemize}
                \item Building blocks for future efforts
            \end{itemize}
    \end{itemize}
    %\begin{center}
    %\includegraphics[width=0.6\textwidth]{st2_done_1000}
    %\end{center}
    %\column{0.35\textwidth}
    %\end{columns}
\end{frame}


%\begin{frame}{Displaced vertex trigger hodoscopes}
%\begin{columns}
%\column{0.65\textwidth}
%\begin{itemize}
%\begin{frame}{Displaced vertex trigger hodoscopes}
%\begin{columns}
%\column{0.65\textwidth}
%\begin{itemize}
%\item Hardware delivered this year:
%\begin{itemize}
%\item Hodoscope boxes and prototypes
%\item Readout and calibration systems
%\item Power supply system
%\item FPGA trigger
%\end{itemize}
%\item Installed and commissioned at Fermilab, and recorded physics data
%\end{itemize}
%\begin{center}
%\includegraphics[width=0.6\textwidth]{st2_done_1000}
%\end{center}
%\column{0.35\textwidth}
%\includegraphics[width=\textwidth]{st1_done_1000}

%\end{columns}
%\end{frame}

%\begin{frame}{Detector design}
%\begin{columns}
%\column{0.65\textwidth}
%\begin{itemize}
%\item Extruded scintillator bars detect charged particles, wavelength-shifting fibers collect light and transport it to the SiPMs
%\item Station 1: four boxes, 80 1-cm bars each
%\item Station 2: four boxes, 50 2-cm bars each
%\end{itemize}
%\begin{center}
%\includegraphics[width=0.7\textwidth]{st2_done_1000}
%\end{center}
%\column{0.35\textwidth}
%\includegraphics[width=\textwidth]{st1_done_1000}
%
%\end{columns}
%\end{frame}
%
%\begin{frame}{Mechanical structure}
%\begin{columns}
%\column{0.65\textwidth}
%\begin{itemize}
%\item Frame modified to minimize material in the detector acceptance
%\item Survey monuments for reproducible positioning
%\item Boxes are light-tight with patch panels for signals and voltages, ventilation flanges for air cooling (if necessary)
%\item Quadrants are bolted together using 80-20 hardware, then bolted to I-beams
%\end{itemize}
%\begin{center}
%\includegraphics[width=0.6\textwidth]{IMG_4793_1000}
%\end{center}
%\column{0.35\textwidth}
%\includegraphics[width=\textwidth]{1mhodo_safety}
%
%\includegraphics[width=\textwidth]{st1_position3}
%\end{columns}
%\end{frame}
%
%\begin{frame}{Readout electronics: preamps}
%\begin{columns}
%\column{0.6\textwidth}
%\begin{itemize}
%\item ``Postage stamp'' x10 preamp design contributed by Fermilab, with modification to the pulse shaper
%\item Benchtop tests confirm gain degradation in magnetic field is acceptable
%\item SiPMs and preamps are mounted on ``preamp plate''
%\item All components electrically isolated from plate to avoid noise pickup
%\item Twisted-pair pigtail connects SiPM to preamp
%\end{itemize}
%\column{0.4\textwidth}
%%\includegraphics[width=\textwidth]{hodoscope_diagram}
%
%\includegraphics[width=\textwidth]{IMG_4794_half}
%
%\includegraphics[width=\textwidth]{IMG_4795_half}
%\end{columns}
%\end{frame}
%
%\begin{frame}{Readout electronics: cabling}
%\begin{columns}
%\column{0.6\textwidth}
%\begin{itemize}
%\item Short coaxial cables connect preamp outputs to patch panel
%\item Long coaxial cables connect patch panel to CAMAC discriminators
%\item Ribbon cables connect discriminators to trigger boards and TDCs
%\end{itemize}
%\column{0.4\textwidth}
%
%%\includegraphics[width=\textwidth,angle=270]{DSCN1860_1000}
%\includegraphics[width=\textwidth]{IMG_2889_crop_1000}
%\end{columns}
%\end{frame}
%
%\begin{frame}{Single-bar beam test}
%\begin{columns}
%\column{0.6\textwidth}
%\begin{itemize}
%\item Single-bar test units: 1-cm and 2-cm units built and tested on the beam at SeaQuest in March
%\item Plots on right (2-cm on top, 1-cm on bottom) show hit times relative to E906 Drell-Yan trigger
%\begin{itemize}
%\item Small peaks are random particles from other beam buckets, big peak is in time with the trigger
%\end{itemize}
%\item Proved the system works with real beam, in the real environment
%\end{itemize}
%\begin{center}
%\includegraphics[width=\textwidth]{IMG_4732}
%\end{center}
%\column{0.4\textwidth}
%\includegraphics[width=\textwidth]{tube1}
%
%\includegraphics[width=\textwidth]{tube2}
%\end{columns}
%\end{frame}

\appendix
\backupbegin



%\begin{frame}{Backup: hodoscope block diagram}
%\begin{center}
%\includegraphics[width=0.6\textwidth]{hodoscope_diagram}
%\end{center}
%\end{frame}
%
%\begin{frame}{Backup: power box block diagram}
%\begin{center}
%\includegraphics[width=\textwidth]{power_box_diagram}
%\end{center}
%\end{frame}
%
%\begin{frame}{Backup: master box block diagram}
%\begin{center}
%\includegraphics[width=0.6\textwidth]{master_box_diagram}
%\end{center}
%\end{frame}
%
\backupend
%\begin{frame}{Fix vertex fit}
%\begin{columns}
%\column{0.6\textwidth}
%\begin{itemize}
%\item The resolution of the reconstructed mass should be independent of Z but is worse for displaced vertices.
%\end{itemize}
%\begin{center}
%\includegraphics[width=\textwidth]{mass_shift_40}
%\end{center}
%\column{0.4\textwidth}
%\includegraphics[width=\textwidth,page=4]{acceptance_40}
%\end{columns}
%\end{frame}

\end{document}
