\section{Data Structures}
Here are the data structures with brief descriptions:\begin{CompactList}
\item\contentsline{section}{\hyperlink{struct__BF__LATp__CntrbStatus}{\_\-BF\_\-LATp\_\-Cntrb\-Status} (Layout of 16-bit LATp contribution status )}{\pageref{struct__BF__LATp__CntrbStatus}}{}
\item\contentsline{section}{\hyperlink{struct__BFcellHeader}{\_\-BFcell\-Header} (Layout of a control cell header )}{\pageref{struct__BFcellHeader}}{}
\item\contentsline{section}{\hyperlink{struct__BFevAEM__VetoAccepts}{\_\-BFev\-AEM\_\-Veto\-Accepts} (Map of 28 byte AEM veto list )}{\pageref{struct__BFevAEM__VetoAccepts}}{}
\item\contentsline{section}{\hyperlink{struct__BFevCAL__LogAccepts}{\_\-BFev\-CAL\_\-Log\-Accepts} (Map of 32-bit calorimeter log accepts word )}{\pageref{struct__BFevCAL__LogAccepts}}{}
\item\contentsline{section}{\hyperlink{struct__BFevCAL__LogData}{\_\-BFev\-CAL\_\-Log\-Data} (Map of 32-bit calorimeter log data word )}{\pageref{struct__BFevCAL__LogData}}{}
\item\contentsline{section}{\hyperlink{struct__BFevDiag__CalLayerEnd}{\_\-BFev\-Diag\_\-Cal\-Layer\-End} (Map of 16 bit calorimeter layer-end diagnostic data )}{\pageref{struct__BFevDiag__CalLayerEnd}}{}
\item\contentsline{section}{\hyperlink{struct__BFevErr__CablePhase}{\_\-BFev\-Err\_\-Cable\-Phase} (Map of 16-bit cable phasing error word )}{\pageref{struct__BFevErr__CablePhase}}{}
\item\contentsline{section}{\hyperlink{struct__BFevErr__CableTimeOut}{\_\-BFev\-Err\_\-Cable\-Time\-Out} (Map of 16-bit cable timeout error word )}{\pageref{struct__BFevErr__CableTimeOut}}{}
\item\contentsline{section}{\hyperlink{struct__BFevErr__GCCC}{\_\-BFev\-Err\_\-GCCC} (Map of 16-bit GCCC error word )}{\pageref{struct__BFevErr__GCCC}}{}
\item\contentsline{section}{\hyperlink{struct__BFevErr__GTCC}{\_\-BFev\-Err\_\-GTCC} (Map of 16-bit GTCC error word )}{\pageref{struct__BFevErr__GTCC}}{}
\item\contentsline{section}{\hyperlink{struct__BFevErr__Summary}{\_\-BFev\-Err\_\-Summary} (Map of 16-bit error summary word )}{\pageref{struct__BFevErr__Summary}}{}
\item\contentsline{section}{\hyperlink{struct__BFevSummary}{\_\-BFev\-Summary} (Map of 32-bit event summary word )}{\pageref{struct__BFevSummary}}{}
\item\contentsline{section}{\hyperlink{struct__BFevTKR__Strip}{\_\-BFev\-TKR\_\-Strip} (Map of tracker strip data )}{\pageref{struct__BFevTKR__Strip}}{}
\item\contentsline{section}{\hyperlink{union__cellHeader}{\_\-cell\-Header} (Union for 16-bit control cell header )}{\pageref{union__cellHeader}}{}
\item\contentsline{section}{\hyperlink{union__evCAL__LogAccepts}{\_\-ev\-CAL\_\-Log\-Accepts} (Union for 32-bit calorimeter log accepts word )}{\pageref{union__evCAL__LogAccepts}}{}
\item\contentsline{section}{\hyperlink{union__evCAL__LogData}{\_\-ev\-CAL\_\-Log\-Data} (Union for 32-bit calorimeter log data word )}{\pageref{union__evCAL__LogData}}{}
\item\contentsline{section}{\hyperlink{struct__evDiag__CalLayer}{\_\-ev\-Diag\_\-Cal\-Layer} (Map of 32-bit Calorimeter layer diagnostic data )}{\pageref{struct__evDiag__CalLayer}}{}
\item\contentsline{section}{\hyperlink{union__evDiag__CalLayerEnd}{\_\-ev\-Diag\_\-Cal\-Layer\-End} (Union for 16-bit struct \hyperlink{struct__BFevDiag__CalLayerEnd}{\_\-BFev\-Diag\_\-Cal\-Layer\-End} )}{\pageref{union__evDiag__CalLayerEnd}}{}
\item\contentsline{section}{\hyperlink{struct__evDiag__Data}{\_\-ev\-Diag\_\-Data} (Map of TEM event diagnostic contribution )}{\pageref{struct__evDiag__Data}}{}
\item\contentsline{section}{\hyperlink{struct__evDiag__TkrTrgReq}{\_\-ev\-Diag\_\-Tkr\-Trg\-Req} (Map of 16 bit calorimeter layer-end diagnostic data )}{\pageref{struct__evDiag__TkrTrgReq}}{}
\item\contentsline{section}{\hyperlink{union__evErr__CablePhase}{\_\-ev\-Err\_\-Cable\-Phase} (Union for 16-bit cable phasing error word )}{\pageref{union__evErr__CablePhase}}{}
\item\contentsline{section}{\hyperlink{union__evErr__CableTimeOut}{\_\-ev\-Err\_\-Cable\-Time\-Out} (Union for 16-bit cable timeout error word )}{\pageref{union__evErr__CableTimeOut}}{}
\item\contentsline{section}{\hyperlink{union__evErr__GCCC}{\_\-ev\-Err\_\-GCCC} (Union for 16-bit GCCC error word )}{\pageref{union__evErr__GCCC}}{}
\item\contentsline{section}{\hyperlink{union__evErr__GTCC}{\_\-ev\-Err\_\-GTCC} (Union for 16-bit GTCC error word )}{\pageref{union__evErr__GTCC}}{}
\item\contentsline{section}{\hyperlink{union__evErr__Summary}{\_\-ev\-Err\_\-Summary} (Union for 16-bit error summary word )}{\pageref{union__evErr__Summary}}{}
\item\contentsline{section}{\hyperlink{union__evSummary}{\_\-ev\-Summary} (Union for 32-bit event summary word )}{\pageref{union__evSummary}}{}
\item\contentsline{section}{\hyperlink{union__evTKR__Strip}{\_\-ev\-TKR\_\-Strip} (Union for 16-bit TKR strip data structure )}{\pageref{union__evTKR__Strip}}{}
\item\contentsline{section}{\hyperlink{struct__LATp__cntrb__hdr}{\_\-LATp\_\-cntrb\_\-hdr} (Layout of a 32-bit LATp contribution header )}{\pageref{struct__LATp__cntrb__hdr}}{}
\item\contentsline{section}{\hyperlink{union__LATp__CntrbStatus}{\_\-LATp\_\-Cntrb\-Status} (Union for 16-bit LATp contribution status )}{\pageref{union__LATp__CntrbStatus}}{}
\end{CompactList}
