\section{File List}
Here is a list of all documented files with brief descriptions:\begin{CompactList}
\item\contentsline{section}{\hyperlink{gglt__DAC_8c}{gglt\_\-DAC.c} (Implements test feature DAC methods for the VME XBRD )}{\pageref{gglt__DAC_8c}}{}
\item\contentsline{section}{\hyperlink{gglt__DAC_8h}{gglt\_\-DAC.h} (Defines the \char`\"{}test feature\char`\"{} methods for the VME XBRD via the GGLT interface )}{\pageref{gglt__DAC_8h}}{}
\item\contentsline{section}{\hyperlink{gglt__err_8h}{gglt\_\-err.h} (Defines public error codes for the gglt interface )}{\pageref{gglt__err_8h}}{}
\item\contentsline{section}{\hyperlink{gglt__event_8c}{gglt\_\-event.c} (Implements mini-GLT event taking )}{\pageref{gglt__event_8c}}{}
\item\contentsline{section}{\hyperlink{gglt__event_8h}{gglt\_\-event.h} (Defines public structs and methods for event taking )}{\pageref{gglt__event_8h}}{}
\item\contentsline{section}{\hyperlink{gglt__init_8c}{gglt\_\-init.c} (Implements init methods for the mini GLT )}{\pageref{gglt__init_8c}}{}
\item\contentsline{section}{\hyperlink{gglt__init_8h}{gglt\_\-init.h} (Defines public interface for mini GLT initialization methods )}{\pageref{gglt__init_8h}}{}
\item\contentsline{section}{\hyperlink{gglt__mode_8h}{gglt\_\-mode.h} (Defines public interface for mini GLT mode switch routines )}{\pageref{gglt__mode_8h}}{}
\item\contentsline{section}{\hyperlink{gglt__p_8h}{gglt\_\-p.h} (Defines private aspects of the gglt handle )}{\pageref{gglt__p_8h}}{}
\item\contentsline{section}{\hyperlink{gglt__reg__p_8h}{gglt\_\-reg\_\-p.h} (Register maps )}{\pageref{gglt__reg__p_8h}}{}
\item\contentsline{section}{\hyperlink{gglt__trg_8c}{gglt\_\-trg.c} (Implements mini-GLT funtionality )}{\pageref{gglt__trg_8c}}{}
\item\contentsline{section}{\hyperlink{gglt__trg_8h}{gglt\_\-trg.h} (Defines public structs and methods for trigger messaging )}{\pageref{gglt__trg_8h}}{}
\end{CompactList}
