\hypertarget{dir_1279d37bd835e9ad4df1e3bca169212b}{
\section{/afs/slac.stanford.edu/g/glast/flight/SVC/source/PBS/dev/src/ Directory Reference}
\label{dir_1279d37bd835e9ad4df1e3bca169212b}\index{/afs/slac.stanford.edu/g/glast/flight/SVC/source/PBS/dev/src/ Directory Reference@{/afs/slac.stanford.edu/g/glast/flight/SVC/source/PBS/dev/src/ Directory Reference}}
}
\subsection*{Directories}
\begin{CompactItemize}
\item 
directory \hyperlink{dir_7fd75b706f599710d04353abdeefef99}{impl}
\end{CompactItemize}
\subsection*{Files}
\begin{CompactItemize}
\item 
file \hyperlink{BSWP_8c}{BSWP.c}
\begin{CompactList}\small\item\em Byteswapping, callable implementation. \item\end{CompactList}

\item 
file \hyperlink{BUG_8c}{BUG.c}
\begin{CompactList}\small\item\em Defines a set of routines for bugchecking the CPU. \item\end{CompactList}

\item 
file \hyperlink{CACHE_8c}{CACHE.c}
\begin{CompactList}\small\item\em Provides the implementation of the portable cache manipulation routines patterned after the VxWorks routines. Currently these are NOOPs on all but the VxWorks platforms. \item\end{CompactList}

\item 
file \hyperlink{FORK_8c}{FORK.c}
\begin{CompactList}\small\item\em The FORK routines. \item\end{CompactList}

\item 
file \hyperlink{FPA_8c}{FPA.c}
\begin{CompactList}\small\item\em Utility for configuring and allocating a pool of Fixed Sized Packets. \item\end{CompactList}

\item 
file \hyperlink{L_8c}{L.c}
\begin{CompactList}\small\item\em Implements the non-inline singly linked list (L) routines. \item\end{CompactList}

\item 
file \hyperlink{LI_8c}{LI.c}
\begin{CompactList}\small\item\em Implementation file for the interlocked singly linked list routines, LI. \item\end{CompactList}

\item 
file \hyperlink{LSU_8c}{LSU.c}
\begin{CompactList}\small\item\em Linear Scaling Utilities for unsigned 32-bit integers. \item\end{CompactList}

\item 
file \hyperlink{LSU__pvt_8ih}{LSU\_\-pvt.ih}
\begin{CompactList}\small\item\em Linear Scaling Utilities, private inline include file. \item\end{CompactList}

\item 
file \hyperlink{MBA_8c}{MBA.c}
\begin{CompactList}\small\item\em Implements the low level memory block allocation routines. \item\end{CompactList}

\item 
file \hyperlink{MTX_8c}{MTX.c}
\begin{CompactList}\small\item\em Simple mutex, traditional call implementation. \item\end{CompactList}

\item 
file \hyperlink{PARITY_8c}{PARITY.c}
\begin{CompactList}\small\item\em Implements the callable interface for the PARITY calculation routines. \item\end{CompactList}

\item 
file \hyperlink{PBS_8c}{PBS.c}
\begin{CompactList}\small\item\em PBS library, contains the initialization routines for PBS. \item\end{CompactList}

\item 
file \hyperlink{PL_8c}{PL.c}
\begin{CompactList}\small\item\em Implements the callable interface for the PL routines. \item\end{CompactList}

\item 
file \hyperlink{PTS_8c}{PTS.c}
\begin{CompactList}\small\item\em Implements the callable interface for the PTS routines. \item\end{CompactList}

\item 
file \hyperlink{Q_8c}{Q.c}
\begin{CompactList}\small\item\em Implements the non-inline Que (Q) routines. \item\end{CompactList}

\item 
file \hyperlink{QI_8c}{QI.c}
\begin{CompactList}\small\item\em Implements the non-inline Que Interlocked (QI) routines. \item\end{CompactList}

\item 
file \hyperlink{RNG_8c}{RNG.c}
\begin{CompactList}\small\item\em Utility for configuring a pool of memory as a ring buffer. \item\end{CompactList}

\item 
file \hyperlink{RW_8c}{RW.c}
\begin{CompactList}\small\item\em Defines the Resource Wait routines. \item\end{CompactList}

\item 
file \hyperlink{RW__tmr_8h}{RW\_\-tmr.h}
\begin{CompactList}\small\item\em The Platform independent Resource Wait timer include file. \item\end{CompactList}

\item 
file \hyperlink{RW__tmr_8ih}{RW\_\-tmr.ih}
\begin{CompactList}\small\item\em Defines platform independent inline Resource Wait timer (RW\_\-tmr) routines. \item\end{CompactList}

\item 
file \hyperlink{RWF_8c}{RWF.c}
\begin{CompactList}\small\item\em Defines the Resource Wait Facility routines. \item\end{CompactList}

\item 
file \hyperlink{SEM_8c}{SEM.c}
\begin{CompactList}\small\item\em Simple semaphore, traditional call implementation. \item\end{CompactList}

\item 
file \hyperlink{SPIN_8c}{SPIN.c}
\begin{CompactList}\small\item\em Spin the CPU for a well-defined period of time, callable implementation. \item\end{CompactList}

\item 
file \hyperlink{TASK_8c}{TASK.c}
\begin{CompactList}\small\item\em TASK, platform independent implementation. \item\end{CompactList}

\item 
file \hyperlink{TASK__pvtdefs_8h}{TASK\_\-pvtdefs.h}
\begin{CompactList}\small\item\em Common private definitions for the TASK facility. \item\end{CompactList}

\item 
file \hyperlink{TAU_8c}{TAU.c}
\begin{CompactList}\small\item\em Thermal Assist Unit, dummy implementation. \item\end{CompactList}

\item 
file \hyperlink{TBD_8c}{TBD.c}
\begin{CompactList}\small\item\em Task Block of Data manager, callable implementation, common platform. \item\end{CompactList}

\item 
file \hyperlink{TBD__pvtdefs_8h}{TBD\_\-pvtdefs.h}
\begin{CompactList}\small\item\em Task Block of Data manager, facility private definitions platform. \item\end{CompactList}

\item 
file \hyperlink{TMR_8c}{TMR.c}
\begin{CompactList}\small\item\em Platform independent TMR routines. \item\end{CompactList}

\item 
file \hyperlink{TOC_8c}{TOC.c}
\begin{CompactList}\small\item\em TimeOut control implementation file, callable version. \item\end{CompactList}

\item 
file \hyperlink{TOV_8c}{TOV.c}
\begin{CompactList}\small\item\em Timeout service routines. \item\end{CompactList}

\item 
file \hyperlink{TSS_8c}{TSS.c}
\begin{CompactList}\small\item\em Implements routines that manipulate a timespec structure. \item\end{CompactList}

\item 
file \hyperlink{WCT_8c}{WCT.c}
\begin{CompactList}\small\item\em Implementation file for WCT (Wall Clock Time) facility. \item\end{CompactList}

\item 
file \hyperlink{WCT__pvtdefs_8h}{WCT\_\-pvtdefs.h}
\begin{CompactList}\small\item\em Package private interface and typedefs for the WCT (Wall Clock Time) facility. \item\end{CompactList}

\item 
file \hyperlink{WCT__pvtdefs_8ih}{WCT\_\-pvtdefs.ih}
\begin{CompactList}\small\item\em Package private interface and typedefs for the WCT (Wall Clock Time) facility. \item\end{CompactList}

\item 
file \hyperlink{WUT_8c}{WUT.c}
\begin{CompactList}\small\item\em WakeUp Timer facility. \item\end{CompactList}

\end{CompactItemize}
