\hypertarget{dir_da630a76540bd60bec7b8bcaf8378680}{
\section{/afs/slac.stanford.edu/g/glast/flight/SVC/source/PBS/V2-12-2/src/impl/ Directory Reference}
\label{dir_da630a76540bd60bec7b8bcaf8378680}\index{/afs/slac.stanford.edu/g/glast/flight/SVC/source/PBS/V2-12-2/src/impl/ Directory Reference@{/afs/slac.stanford.edu/g/glast/flight/SVC/source/PBS/V2-12-2/src/impl/ Directory Reference}}
}
\subsection*{Files}
\begin{CompactItemize}
\item 
file \hyperlink{MBA_8c_8vx-ppc-gcc}{MBA.c.vx-ppc-gcc}
\begin{CompactList}\small\item\em Implements the low level memory block allocation routines for the VxWorks platform. \item\end{CompactList}

\item 
file \hyperlink{MTX_8c_8vx-ppc-gcc}{MTX.c.vx-ppc-gcc}
\begin{CompactList}\small\item\em Simple mutex, VXWORKS traditional call implementation. \item\end{CompactList}

\item 
file \hyperlink{PARITY_8c_8xx-ppc-gcc}{PARITY.c.xx-ppc-gcc}
\begin{CompactList}\small\item\em Implements the callable interface for the PARITY calculation routines for the PowerPC using GCC compiler. \item\end{CompactList}

\item 
file \hyperlink{PBS_8c_8vx-ppc-gcc}{PBS.c.vx-ppc-gcc}
\begin{CompactList}\small\item\em PBS library, contains the PPC specific code for PBS. \item\end{CompactList}

\item 
file \hyperlink{PTS_8c_8vx-ppc-gcc}{PTS.c.vx-ppc-gcc}
\begin{CompactList}\small\item\em Implements the PPC/GCC version of the PTS routines. \item\end{CompactList}

\item 
file \hyperlink{RW_8c_8vx-xxx-xxx}{RW.c.vx-xxx-xxx}
\begin{CompactList}\small\item\em Defines the VxWorks platform dependent inline Resource Wait (RW) routines. \item\end{CompactList}

\item 
file \hyperlink{RW__tmr_8c_8vx-xxx-xxx}{RW\_\-tmr.c.vx-xxx-xxx}
\begin{CompactList}\small\item\em Defines the VxWorks platform dependent non-inline Resource Wait timer (RW\_\-tmr) routines. \item\end{CompactList}

\item 
file \hyperlink{RW__tmr_8h_8vx-xxx-xxx}{RW\_\-tmr.h.vx-xxx-xxx}
\begin{CompactList}\small\item\em Defines the VxWorks platform dependent includes for Resource Wait timer (RW\_\-tmr) routines. \item\end{CompactList}

\item 
file \hyperlink{RW__tmr_8ih_8vx-xxx-xxx}{RW\_\-tmr.ih.vx-xxx-xxx}
\begin{CompactList}\small\item\em Defines the VxWorks platform dependent inline Resource Wait timer (RW\_\-tmr) routines. \item\end{CompactList}

\item 
file \hyperlink{SEM_8c_8vx-ppc-gcc}{SEM.c.vx-ppc-gcc}
\begin{CompactList}\small\item\em Simple semaphore, VXWORKS traditional call implementation. \item\end{CompactList}

\item 
file \hyperlink{TASK_8c_8vx-xxx-xxx}{TASK.c.vx-xxx-xxx}
\begin{CompactList}\small\item\em The VxWorks implementation of the TASK utilities. \item\end{CompactList}

\item 
file \hyperlink{TASK__pvtdefs_8h_8vx-xxx-xxx}{TASK\_\-pvtdefs.h.vx-xxx-xxx}
\begin{CompactList}\small\item\em POSIX specific private definitions for the TASK facility. \item\end{CompactList}

\item 
file \hyperlink{TAU_8c_8vx-ppc750-gcc}{TAU.c.vx-ppc750-gcc}
\begin{CompactList}\small\item\em Thermal Assist Unit, implementation. \item\end{CompactList}

\item 
file \hyperlink{TBD_8c_8vx-xxx-xxx}{TBD.c.vx-xxx-xxx}
\begin{CompactList}\small\item\em Task Block of Data manager, callable implementation, VXWORKS platform. \item\end{CompactList}

\item 
file \hyperlink{TBD__pvtdefs_8h_8vx-xxx-xxx}{TBD\_\-pvtdefs.h.vx-xxx-xxx}
\begin{CompactList}\small\item\em Task Block of Data manager, callable implementation, VXWORKS platform. \item\end{CompactList}

\item 
file \hyperlink{TOV_8c_8vx-xxx-xxx}{TOV.c.vx-xxx-xxx}
\begin{CompactList}\small\item\em Timeout service routines implementation for a VXWORKS platform. \item\end{CompactList}

\item 
file \hyperlink{WCT_8c_8vx-xxx-xxx}{WCT.c.vx-xxx-xxx}
\begin{CompactList}\small\item\em Implementation file for the WCT (Wall Clock Time) facility for VXWORK's platform. \item\end{CompactList}

\item 
file \hyperlink{WCT__pvtdefs_8h_8vx-xxx-xxx}{WCT\_\-pvtdefs.h.vx-xxx-xxx}
\begin{CompactList}\small\item\em Package private interface and typedefs for the WCT (Wall Clock Time) facility for VXWORK's platform. \item\end{CompactList}

\item 
file \hyperlink{WCT__pvtdefs_8ih_8vx-xxx-xxx}{WCT\_\-pvtdefs.ih.vx-xxx-xxx}
\begin{CompactList}\small\item\em Package private inlines, structures and typedefs for the WCT (Wall Clock Time) facility for VXWORK's platform. \item\end{CompactList}

\item 
file \hyperlink{WUT_8c_8vx-ppc-gcc}{WUT.c.vx-ppc-gcc}
\begin{CompactList}\small\item\em WakeUp Timer facility. \item\end{CompactList}

\item 
file \hyperlink{WUT__monitor_8h_8vx-ppc-xxx}{WUT\_\-monitor.h.vx-ppc-xxx}
\begin{CompactList}\small\item\em WUT monitoring/diagnostic code. \item\end{CompactList}

\item 
file \hyperlink{WUT__trace_8h_8vx-ppc-gcc}{WUT\_\-trace.h.vx-ppc-gcc}
\begin{CompactList}\small\item\em Optionally defines routines and macros to utilize the TEX trace facility. \item\end{CompactList}

\item 
file \hyperlink{WUT__wakeup_8c_8vx-ppc-gcc}{WUT\_\-wakeup.c.vx-ppc-gcc}
\begin{CompactList}\small\item\em WakeUp Timer timer countdown facility. \item\end{CompactList}

\item 
file \hyperlink{WUT__wakeup_8h_8vx-ppc-gcc}{WUT\_\-wakeup.h.vx-ppc-gcc}
\begin{CompactList}\small\item\em WakeUp Timer timer countdown facility. \item\end{CompactList}

\end{CompactItemize}
