\hypertarget{L_8c}{
\section{L.c File Reference}
\label{L_8c}\index{L.c@{L.c}}
}
Implements the non-inline singly linked list (L) routines.  




\subsection{Detailed Description}
Implements the non-inline singly linked list (L) routines. 

\begin{Desc}
\item[Author:]JJRussell - \href{mailto:russell@slac.stanford.edu}{\tt russell@slac.stanford.edu}\end{Desc}


\footnotesize\begin{verbatim}
    CVS $Id: L.c,v 1.4 2004/10/20 14:36:53 russell Exp $
  \end{verbatim}\normalsize


This implements the non-inline versions of the L routines. These allow the user to build non-interlocked singly linked lists.

See also the non-inline versions of these routines which may save code space and increase modularity at the expense of performance. The LI routines provide the same functionality with the added feature of being interlocked, and, therefore, thread safe.