\hypertarget{TAU_8ih}{
\section{TAU.ih File Reference}
\label{TAU_8ih}\index{TAU.ih@{TAU.ih}}
}
Thermal Assist Unit, inline interface.  


{\tt \#include \char`\"{}PBS/impl/TAU.ih.xx-xxx-xxx\char`\"{}}\par


Include dependency graph for TAU.ih:\begin{figure}[H]
\begin{center}
\leavevmode
\includegraphics[width=96pt]{TAU_8ih__incl}
\end{center}
\end{figure}


This graph shows which files directly or indirectly include this file:\begin{figure}[H]
\begin{center}
\leavevmode
\includegraphics[width=75pt]{TAU_8ih__dep__incl}
\end{center}
\end{figure}


\subsection{Detailed Description}
Thermal Assist Unit, inline interface. 

\begin{Desc}
\item[Author:]JJRussell - \href{mailto:russell@slac.stanford.edu}{\tt russell@slac.stanford.edu}\end{Desc}


\footnotesize\begin{verbatim}
    CVS $Id: TAU.ih,v 1.1 2004/03/05 22:26:06 russell Exp $
\end{verbatim}\normalsize


\begin{Desc}
\item[SYNOPSIS]This defines the inline versions of the TAU routines. These provide a C interface the TAU registers and functionality.\end{Desc}
See also the callable interface. For the most part, the routines in this section are available only in inline versions because they are simply covers for a {\em mtspr\/} or {\em mfspr\/} instruction.