\hypertarget{TAU_8c}{
\section{TAU.c File Reference}
\label{TAU_8c}\index{TAU.c@{TAU.c}}
}
Thermal Assist Unit, dummy implementation.  


{\tt \#include \char`\"{}PBS/TAU.h\char`\"{}}\par
{\tt \#include \char`\"{}impl/TAU.c.xx-xxx-xxx\char`\"{}}\par


Include dependency graph for TAU.c:\begin{figure}[H]
\begin{center}
\leavevmode
\includegraphics[width=168pt]{TAU_8c__incl}
\end{center}
\end{figure}


\subsection{Detailed Description}
Thermal Assist Unit, dummy implementation. 

\begin{Desc}
\item[Author:]JJRussell - \href{mailto:russell@slac.stanford.edu}{\tt russell@slac.stanford.edu}\end{Desc}


\footnotesize\begin{verbatim}
    CVS $Id: TAU.c,v 1.2 2004/06/03 04:44:15 russell Exp $
\end{verbatim}\normalsize


The TAU facility is supported only on PPC750 platforms. A baredones dummy implementation is provided on non-PPC750 platforms. This file merely includes the correct implementation.