\hypertarget{WCT_8c}{
\section{WCT.c File Reference}
\label{WCT_8c}\index{WCT.c@{WCT.c}}
}
Implementation file for WCT (Wall Clock Time) facility.  


{\tt \#include \char`\"{}PBS/WCT.h\char`\"{}}\par
{\tt \#include \char`\"{}WCT\_\-pvtdefs.h\char`\"{}}\par
{\tt \#include \char`\"{}WCT\_\-pvtdefs.ih\char`\"{}}\par


Include dependency graph for WCT.c:\begin{figure}[H]
\begin{center}
\leavevmode
\includegraphics[width=207pt]{WCT_8c__incl}
\end{center}
\end{figure}


\subsection{Detailed Description}
Implementation file for WCT (Wall Clock Time) facility. 

\begin{Desc}
\item[Author:]JJRussell - \href{mailto:russell@slac.stanford.edu}{\tt russell@slac.stanford.edu}\end{Desc}


\footnotesize\begin{verbatim}

    CVS $Id: WCT.c,v 1.5 2005/05/04 20:53:04 russell Exp $
\end{verbatim}\normalsize


This file simple picks up the correct implementation for th