\hypertarget{dir_000010}{
\section{/afs/slac.stanford.edu/g/glast/flight/SVC/source/PBS/V2-10-10/src/impl/ Directory Reference}
\label{dir_000010}\index{/afs/slac.stanford.edu/g/glast/flight/SVC/source/PBS/V2-10-10/src/impl/ Directory Reference@{/afs/slac.stanford.edu/g/glast/flight/SVC/source/PBS/V2-10-10/src/impl/ Directory Reference}}
}


\begin{figure}[H]
\begin{center}
\leavevmode
\includegraphics[width=61pt]{dir_000010_dep}
\end{center}
\end{figure}
\subsection*{Files}
\begin{CompactItemize}
\item 
file \hyperlink{MBA_8c_8xx-xxx-xxx}{MBA.c.xx-xxx-xxx}
\begin{CompactList}\small\item\em Implements the low level memory block allocation routines for a generic platform. \item\end{CompactList}

\item 
file \hyperlink{MTX_8c_8xx-xxx-xxx}{MTX.c.xx-xxx-xxx}
\begin{CompactList}\small\item\em Simple mutex, with traditional call interface implemented by turning the inline versions into callable versions implementation. \item\end{CompactList}

\item 
file \hyperlink{PARITY_8c_8xx-xxx-xxx}{PARITY.c.xx-xxx-xxx}
\begin{CompactList}\small\item\em Implements the callable interface for the PARITY calculation routines using a generic implementation. \item\end{CompactList}

\item 
file \hyperlink{PBS_8c_8xx-xxx-xxx}{PBS.c.xx-xxx-xxx}
\begin{CompactList}\small\item\em PBS library, contains the PPC specific code for PBS. \item\end{CompactList}

\item 
file \hyperlink{PTS_8c_8sx-xxx-xxx}{PTS.c.sx-xxx-xxx}
\begin{CompactList}\small\item\em Implements the SUN/SOLARIS version of the PTS routines. \item\end{CompactList}

\item 
file \hyperlink{RW_8c_8px-xxx-xxx}{RW.c.px-xxx-xxx}
\begin{CompactList}\small\item\em Defines the POSIX platform dependent inline Resource Wait (RW) routines. \item\end{CompactList}

\item 
file \hyperlink{RW__tmr_8c_8px-xxx-xxx}{RW\_\-tmr.c.px-xxx-xxx}
\begin{CompactList}\small\item\em Defines the POSIX platform dependent non-inline Resource Wait timer (RW\_\-tmr) routines. This is currently just a placeholder. \item\end{CompactList}

\item 
file \hyperlink{RW__tmr_8h_8px-xxx-xxx}{RW\_\-tmr.h.px-xxx-xxx}
\begin{CompactList}\small\item\em The POSIX platform dependent Resource Wait timer include file. \item\end{CompactList}

\item 
file \hyperlink{RW__tmr_8ih_8px-xxx-xxx}{RW\_\-tmr.ih.px-xxx-xxx}
\begin{CompactList}\small\item\em Defines the POSIX platform dependent Resource Wait timer (RW\_\-tmr) routines. \item\end{CompactList}

\item 
file \hyperlink{SEM_8c_8xx-xxx-xxx}{SEM.c.xx-xxx-xxx}
\begin{CompactList}\small\item\em Simple semaphore, with traditional call interface implemented by turning the inline versions into callable versions implementation. \item\end{CompactList}

\item 
file \hyperlink{TASK_8c_8px-xxx-xxx}{TASK.c.px-xxx-xxx}
\begin{CompactList}\small\item\em The POSIX implementation of the TASK utilities. \item\end{CompactList}

\item 
file \hyperlink{TASK__pvtdefs_8h_8px-xxx-xxx}{TASK\_\-pvtdefs.h.px-xxx-xxx}
\begin{CompactList}\small\item\em POSIX specific private definitions for the TASK facility. \item\end{CompactList}

\item 
file \hyperlink{TAU_8c_8xx-xxx-xxx}{TAU.c.xx-xxx-xxx}
\begin{CompactList}\small\item\em Thermal Assist Unit, dummy implementation. \item\end{CompactList}

\item 
file \hyperlink{TBD_8c_8px-xxx-xxx}{TBD.c.px-xxx-xxx}
\begin{CompactList}\small\item\em Task Block of Data manager, callable implementation, POSIX platform. \item\end{CompactList}

\item 
file \hyperlink{TBD__pvtdefs_8h_8px-xxx-xxx}{TBD\_\-pvtdefs.h.px-xxx-xxx}
\begin{CompactList}\small\item\em Task Block of Data manager, callable implementation, POSIX platform. \item\end{CompactList}

\item 
file \hyperlink{TOV_8c_8px-xxx-xxx}{TOV.c.px-xxx-xxx}
\begin{CompactList}\small\item\em Timeout service routines implementation for a POSIX compliant platform. \item\end{CompactList}

\item 
file \hyperlink{TOV__pvtdefs_8h_8px-xxx-xxx}{TOV\_\-pvtdefs.h.px-xxx-xxx}
\begin{CompactList}\small\item\em Defines TOV POSIX platform specific implementation Linked List Interlocked (LLI) routines. \item\end{CompactList}

\item 
file \hyperlink{WCT_8c_8ux-xxx-xxx}{WCT.c.ux-xxx-xxx}
\begin{CompactList}\small\item\em Implementation file for the WCT (Wall Clock Time) facility for UNIX platforms. \item\end{CompactList}

\item 
file \hyperlink{WCT__pvtdefs_8h_8ux-xxx-xxx}{WCT\_\-pvtdefs.h.ux-xxx-xxx}
\begin{CompactList}\small\item\em Package private interface and typedefs for the WCT (Wall Clock Time) facility for UNIX platforms. \item\end{CompactList}

\item 
file \hyperlink{WCT__pvtdefs_8ih_8ux-xxx-xxx}{WCT\_\-pvtdefs.ih.ux-xxx-xxx}
\begin{CompactList}\small\item\em Package private inlines, structures and typedefs for the WCT (Wall Clock Time) facility for VXWORK's platform. \item\end{CompactList}

\item 
file \hyperlink{WUT_8c_8px-xxx-xxx}{WUT.c.px-xxx-xxx}
\begin{CompactList}\small\item\em Wake\-Up Timer facility. \item\end{CompactList}

\end{CompactItemize}
