\hypertarget{dir_000007}{
\section{/afs/slac.stanford.edu/g/glast/flight/SVC/source/LSF/V0-0-2/LSF/ Directory Reference}
\label{dir_000007}\index{/afs/slac.stanford.edu/g/glast/flight/SVC/source/LSF/V0-0-2/LSF/ Directory Reference@{/afs/slac.stanford.edu/g/glast/flight/SVC/source/LSF/V0-0-2/LSF/ Directory Reference}}
}


\begin{figure}[H]
\begin{center}
\leavevmode
\includegraphics[width=61pt]{dir_000007_dep}
\end{center}
\end{figure}
\subsection*{Files}
\begin{CompactItemize}
\item 
file \hyperlink{LSF_8h}{LSF.h}
\begin{CompactList}\small\item\em Maps out the LSF data structures. \item\end{CompactList}

\item 
file \hyperlink{LSF__endianness_8h}{LSF\_\-endianness.h}
\begin{CompactList}\small\item\em Provides definitions of the ENDIANNESS of the target machine. The symbols {\em ENDIANNESS\_\-IS\_\-LITTLE\/} and {\em ENDIANNESS\_\-IS\_\-BIG\/} should be used in preprocessing directives to determine the endianness of the machine, while the symbol {\em ENDIANNESS\/} can be more easily used in 'C' code. \item\end{CompactList}

\item 
file \hyperlink{LSF__print_8h}{LSF\_\-print.h}
\begin{CompactList}\small\item\em Interface to generic LSF print routines. \item\end{CompactList}

\end{CompactItemize}
