\section{File List}
Here is a list of all documented files with brief descriptions:\begin{CompactList}
\item\contentsline{section}{\hyperlink{decode_8h}{decode.h} (Top-level decoding routines )}{\pageref{decode_8h}}{}
\item\contentsline{section}{\hyperlink{decompress_8h}{decompress.h} (Lowest-level decompression routines )}{\pageref{decompress_8h}}{}
\item\contentsline{section}{\hyperlink{decompress__p_8h}{decompress\_\-p.h} (Internal structure used by the decompression routines )}{\pageref{decompress__p_8h}}{}
\item\contentsline{section}{\hyperlink{evt_8c}{evt.c} (Event handling routines )}{\pageref{evt_8c}}{}
\item\contentsline{section}{\hyperlink{evt_8h}{evt.h} (Definition of the structure holding a decompressed calibration event )}{\pageref{evt_8h}}{}
\item\contentsline{section}{\hyperlink{expand_8h}{expand.h} (Expansion routines )}{\pageref{expand_8h}}{}
\item\contentsline{section}{\hyperlink{QSEC_8h}{QSEC.h} (Interface to the calibration event context updating routines )}{\pageref{QSEC_8h}}{}
\item\contentsline{section}{\hyperlink{QSEC__ctx_8h}{QSEC\_\-ctx.h} (Context data for charge injection calibration events )}{\pageref{QSEC__ctx_8h}}{}
\item\contentsline{section}{\hyperlink{QSEC__p_8h}{QSEC\_\-p.h} (Provides the definition of the QSEC structure )}{\pageref{QSEC__p_8h}}{}
\item\contentsline{section}{\hyperlink{test_8c}{test.c} (Test of the calibration data decode functions )}{\pageref{test_8c}}{}
\item\contentsline{section}{\hyperlink{test__decompress_8c}{test\_\-decompress.c} (Test of the decompression functionality )}{\pageref{test__decompress_8c}}{}
\item\contentsline{section}{\hyperlink{test__decompress__p_8h}{test\_\-decompress\_\-p.h} (Test of the compression functionality )}{\pageref{test__decompress__p_8h}}{}
\item\contentsline{section}{\hyperlink{test__expand_8c}{test\_\-expand.c} (Test of the compression functionality )}{\pageref{test__expand_8c}}{}
\item\contentsline{section}{\hyperlink{test__expand__p_8h}{test\_\-expand\_\-p.h} (Test of the expansion functionality )}{\pageref{test__expand__p_8h}}{}
\item\contentsline{section}{\hyperlink{test__main_8c}{test\_\-main.c} (Test of the calibration output functions )}{\pageref{test__main_8c}}{}
\end{CompactList}
