\hypertarget{structQSEC__decompressionDesc}{
\section{QSEC\_\-decompressionDesc Struct Reference}
\label{structQSEC__decompressionDesc}\index{QSEC\_\-decompressionDesc@{QSEC\_\-decompressionDesc}}
}
Initial parameters used as part of the description of a compression structure (used when consigning the data).  


{\tt \#include $<$decompress\_\-p.h$>$}



\subsection{Detailed Description}
Initial parameters used as part of the description of a compression structure (used when consigning the data). 

The documentation for this struct was generated from the following file:\begin{CompactItemize}
\item 
\hyperlink{decompress__p_8h}{decompress\_\-p.h}\end{CompactItemize}
