\hypertarget{structQSEC__calDecompress}{
\section{QSEC\_\-calDecompress Struct Reference}
\label{structQSEC__calDecompress}\index{QSEC_calDecompress@{QSEC\_\-calDecompress}}
}
Private structure holding the decompression information for the calorimeter.  


{\tt \#include $<$expand\_\-p.h$>$}

\subsection*{Public Attributes}
\begin{CompactItemize}
\item 
\hypertarget{structQSEC__calDecompress_1df9e7eeaab063fd3648303ced3c2d9d}{
unsigned \hyperlink{structQSEC__calDecompress_1df9e7eeaab063fd3648303ced3c2d9d}{range}}
\label{structQSEC__calDecompress_1df9e7eeaab063fd3648303ced3c2d9d}

\begin{CompactList}\small\item\em Indicates 4-range or auto-range. \item\end{CompactList}\item 
\hypertarget{structQSEC__calDecompress_62c92081521492a2290f43c72b6403d4}{
\hyperlink{structQSEC__decompression__}{QSEC\_\-decompression} $\ast$ \hyperlink{structQSEC__calDecompress_62c92081521492a2290f43c72b6403d4}{towers}}
\label{structQSEC__calDecompress_62c92081521492a2290f43c72b6403d4}

\begin{CompactList}\small\item\em Decompression structure for the tower maps. \item\end{CompactList}\item 
\hypertarget{structQSEC__calDecompress_f68c8f02f2ca978ac2f7abf1c8b857e7}{
\hyperlink{structQSEC__decompression__}{QSEC\_\-decompression} $\ast$ \hyperlink{structQSEC__calDecompress_f68c8f02f2ca978ac2f7abf1c8b857e7}{diags}}
\label{structQSEC__calDecompress_f68c8f02f2ca978ac2f7abf1c8b857e7}

\begin{CompactList}\small\item\em Decompression structure for the diagnostic maps. \item\end{CompactList}\item 
\hypertarget{structQSEC__calDecompress_839115c9d93b4ede21740f4f525c4352}{
\hyperlink{structQSEC__decompression__}{QSEC\_\-decompression} $\ast$ \hyperlink{structQSEC__calDecompress_839115c9d93b4ede21740f4f525c4352}{layCnts}}
\label{structQSEC__calDecompress_839115c9d93b4ede21740f4f525c4352}

\begin{CompactList}\small\item\em Decompression structures for the layer counts. \item\end{CompactList}\item 
\hypertarget{structQSEC__calDecompress_aa66472e73d4c932372ee44b45221801}{
\hyperlink{structQSEC__decompression__}{QSEC\_\-decompression} $\ast$ \hyperlink{structQSEC__calDecompress_aa66472e73d4c932372ee44b45221801}{columns}}
\label{structQSEC__calDecompress_aa66472e73d4c932372ee44b45221801}

\begin{CompactList}\small\item\em Decompression structures for the log masks. \item\end{CompactList}\item 
\hypertarget{structQSEC__calDecompress_830f5f19d5a1e54f26976e75c3e417b6}{
\hyperlink{structQSEC__decompression__}{QSEC\_\-decompression} $\ast$ \hyperlink{structQSEC__calDecompress_830f5f19d5a1e54f26976e75c3e417b6}{ranges}}
\label{structQSEC__calDecompress_830f5f19d5a1e54f26976e75c3e417b6}

\begin{CompactList}\small\item\em Decompression structure for the calorimeter ranges. \item\end{CompactList}\item 
\hypertarget{structQSEC__calDecompress_1868dff42be52040c4537b4f87abcf02}{
\hyperlink{structQSEC__decompression__}{QSEC\_\-decompression} $\ast$ \hyperlink{structQSEC__calDecompress_1868dff42be52040c4537b4f87abcf02}{means} \mbox{[}LSEC\_\-N\_\-CAL\_\-RNG\mbox{]}}
\label{structQSEC__calDecompress_1868dff42be52040c4537b4f87abcf02}

\begin{CompactList}\small\item\em Decompression structures for the the calorimeter log mean values. \item\end{CompactList}\item 
\hypertarget{structQSEC__calDecompress_269087b570916950d145daa065027fe5}{
\hyperlink{structQSEC__decompression__}{QSEC\_\-decompression} $\ast$ \hyperlink{structQSEC__calDecompress_269087b570916950d145daa065027fe5}{logs} \mbox{[}LSEC\_\-N\_\-CAL\_\-RNG\mbox{]}}
\label{structQSEC__calDecompress_269087b570916950d145daa065027fe5}

\begin{CompactList}\small\item\em Decompression structures for the CAL log subtracted mean values. \item\end{CompactList}\item 
\hypertarget{structQSEC__calDecompress_4a02313d1c25892888f2ee5819d1cb88}{
\hyperlink{structQSEC__decompression__}{QSEC\_\-decompression} $\ast$ \hyperlink{structQSEC__calDecompress_4a02313d1c25892888f2ee5819d1cb88}{accepts}}
\label{structQSEC__calDecompress_4a02313d1c25892888f2ee5819d1cb88}

\begin{CompactList}\small\item\em Decompression structure for the CAL accepts. \item\end{CompactList}\item 
\hypertarget{structQSEC__calDecompress_d29c3f1ebc151f0a33b8d27533051b55}{
unsigned \hyperlink{structQSEC__calDecompress_d29c3f1ebc151f0a33b8d27533051b55}{mean} \mbox{[}LSEC\_\-N\_\-TWR\mbox{]}\mbox{[}LSEC\_\-N\_\-CAL\_\-LAY\mbox{]}\mbox{[}LSEC\_\-N\_\-CAL\_\-COL\mbox{]}\mbox{[}LSEC\_\-N\_\-CAL\_\-END\mbox{]}\mbox{[}LSEC\_\-N\_\-CAL\_\-RNG\mbox{]}}
\label{structQSEC__calDecompress_d29c3f1ebc151f0a33b8d27533051b55}

\begin{CompactList}\small\item\em Calorimeter log mean values. \item\end{CompactList}\end{CompactItemize}


\subsection{Detailed Description}
Private structure holding the decompression information for the calorimeter. 

The documentation for this struct was generated from the following file:\begin{CompactItemize}
\item 
\hyperlink{expand__p_8h}{expand\_\-p.h}\end{CompactItemize}
