\hypertarget{structQSEC__acdDecompress}{
\section{QSEC\_\-acdDecompress Struct Reference}
\label{structQSEC__acdDecompress}\index{QSEC_acdDecompress@{QSEC\_\-acdDecompress}}
}
Private structure holding the decompression information for the ACD.  


{\tt \#include $<$expand\_\-p.h$>$}

\subsection*{Public Attributes}
\begin{CompactItemize}
\item 
\hypertarget{structQSEC__acdDecompress_38ed921c71ac9e699f37e6d6a402e228}{
\hyperlink{structQSEC__decompression__}{QSEC\_\-decompression} $\ast$ \hyperlink{structQSEC__acdDecompress_38ed921c71ac9e699f37e6d6a402e228}{cables}}
\label{structQSEC__acdDecompress_38ed921c71ac9e699f37e6d6a402e228}

\begin{CompactList}\small\item\em The electronics cable number (0-11). \item\end{CompactList}\item 
\hypertarget{structQSEC__acdDecompress_464bed6cfb5c0225e8cf2f43301b5a50}{
\hyperlink{structQSEC__decompression__}{QSEC\_\-decompression} $\ast$ \hyperlink{structQSEC__acdDecompress_464bed6cfb5c0225e8cf2f43301b5a50}{chns}}
\label{structQSEC__acdDecompress_464bed6cfb5c0225e8cf2f43301b5a50}

\begin{CompactList}\small\item\em The channel number within a board (0-17). \item\end{CompactList}\item 
\hyperlink{structQSEC__decompression__}{QSEC\_\-decompression} $\ast$ \hyperlink{structQSEC__acdDecompress_4a20feed41a3129990b71a842b610141}{phas}
\begin{CompactList}\small\item\em The PHA value, i.e. \item\end{CompactList}\item 
\hypertarget{structQSEC__acdDecompress_cf400ead4ab9cd8387adef9853e8ef47}{
\hyperlink{structQSEC__decompression__}{QSEC\_\-decompression} $\ast$ \hyperlink{structQSEC__acdDecompress_cf400ead4ab9cd8387adef9853e8ef47}{pvahs}}
\label{structQSEC__acdDecompress_cf400ead4ab9cd8387adef9853e8ef47}

\begin{CompactList}\small\item\em Combined state of the PHA parity error, PHA value valid flag, accept flag and hit flag. \item\end{CompactList}\end{CompactItemize}


\subsection{Detailed Description}
Private structure holding the decompression information for the ACD. 

\subsection{Member Data Documentation}
\hypertarget{structQSEC__acdDecompress_4a20feed41a3129990b71a842b610141}{
\index{QSEC_acdDecompress@{QSEC\_\-acdDecompress}!phas@{phas}}
\index{phas@{phas}!QSEC_acdDecompress@{QSEC\_\-acdDecompress}}
\subsubsection{\setlength{\rightskip}{0pt plus 5cm}{\bf QSEC\_\-decompression}$\ast$ {\bf QSEC\_\-acdDecompress::phas}}}
\label{structQSEC__acdDecompress_4a20feed41a3129990b71a842b610141}


The PHA value, i.e. 

the ADC range plus the ADC value 

The documentation for this struct was generated from the following file:\begin{CompactItemize}
\item 
\hyperlink{expand__p_8h}{expand\_\-p.h}\end{CompactItemize}
