\hypertarget{struct__QSEC}{
\section{\_\-QSEC Struct Reference}
\label{struct__QSEC}\index{_QSEC@{\_\-QSEC}}
}
Structure tying together the calibration decoding context and the general event decoding context.  


{\tt \#include $<$QSEC\_\-p.h$>$}

Collaboration diagram for \_\-QSEC:\begin{figure}[H]
\begin{center}
\leavevmode
\includegraphics[width=158pt]{struct__QSEC__coll__graph}
\end{center}
\end{figure}
\subsection*{Data Fields}
\begin{CompactItemize}
\item 
\hypertarget{struct__QSEC_o0}{
QSE\_\-ctx \hyperlink{struct__QSEC_o0}{ctx}}
\label{struct__QSEC_o0}

\begin{CompactList}\small\item\em Standard event context/meta-information. \item\end{CompactList}\item 
\hypertarget{struct__QSEC_o1}{
\hyperlink{struct__QSEC__ctx}{QSEC\_\-ctx} \hyperlink{struct__QSEC_o1}{atx}}
\label{struct__QSEC_o1}

\begin{CompactList}\small\item\em Calibration context (LCI controlled registers). \item\end{CompactList}\item 
\hypertarget{struct__QSEC_o2}{
EBF\_\-gem \hyperlink{struct__QSEC_o2}{gem}}
\label{struct__QSEC_o2}

\begin{CompactList}\small\item\em Decoded GEM contribution (used to update). \item\end{CompactList}\item 
\hypertarget{struct__QSEC_o3}{
void $\ast$ \hyperlink{struct__QSEC_o3}{dtx}}
\label{struct__QSEC_o3}

\begin{CompactList}\small\item\em Calibration specific private context. \item\end{CompactList}\item 
\hypertarget{struct__QSEC_o4}{
int \hyperlink{struct__QSEC_o4}{free}}
\label{struct__QSEC_o4}

\begin{CompactList}\small\item\em Flag indicating whether to free this structure. \item\end{CompactList}\end{CompactItemize}


\subsection{Detailed Description}
Structure tying together the calibration decoding context and the general event decoding context. 



The documentation for this struct was generated from the following file:\begin{CompactItemize}
\item 
\hyperlink{QSEC__p_8h}{QSEC\_\-p.h}\end{CompactItemize}
