\section{Data Structures}
Here are the data structures with brief descriptions:\begin{CompactList}
\item\contentsline{section}{\hyperlink{struct__ApidStream}{\_\-Apid\-Stream} (The print context for one APID )}{\pageref{struct__ApidStream}}{}
\item\contentsline{section}{\hyperlink{struct__Ctl}{\_\-Ctl} (Run time print options/parameters )}{\pageref{struct__Ctl}}{}
\item\contentsline{section}{\hyperlink{struct__QSEC__acd}{\_\-QSEC\_\-acd} (ACD specific context )}{\pageref{struct__QSEC__acd}}{}
\item\contentsline{section}{\hyperlink{struct__QSEC__acd__v0}{\_\-QSEC\_\-acd\_\-v0} (ACD specific context )}{\pageref{struct__QSEC__acd__v0}}{}
\item\contentsline{section}{\hyperlink{struct__QSEC__cal}{\_\-QSEC\_\-cal} (Calorimeter specific context )}{\pageref{struct__QSEC__cal}}{}
\item\contentsline{section}{\hyperlink{struct__QSEC__cal__v0}{\_\-QSEC\_\-cal\_\-v0} (Calorimeter specific context )}{\pageref{struct__QSEC__cal__v0}}{}
\item\contentsline{section}{\hyperlink{struct__QSEC__channel}{\_\-QSEC\_\-channel} (Channel masking used to collect these events )}{\pageref{struct__QSEC__channel}}{}
\item\contentsline{section}{\hyperlink{struct__QSEC__ctx}{\_\-QSEC\_\-ctx} (Structure defining the complete calibration context )}{\pageref{struct__QSEC__ctx}}{}
\item\contentsline{section}{\hyperlink{struct__QSEC__ctx__v0}{\_\-QSEC\_\-ctx\_\-v0} (Structure defining the complete calibration context )}{\pageref{struct__QSEC__ctx__v0}}{}
\item\contentsline{section}{\hyperlink{struct__QSEC__global}{\_\-QSEC\_\-global} (Context of the calibration common to all modes )}{\pageref{struct__QSEC__global}}{}
\item\contentsline{section}{\hyperlink{struct__QSEC__global__v0}{\_\-QSEC\_\-global\_\-v0} (Context of the calibration common to all modes )}{\pageref{struct__QSEC__global__v0}}{}
\item\contentsline{section}{\hyperlink{union__QSEC__specific}{\_\-QSEC\_\-specific} (Union of the context specific to each calibration mode )}{\pageref{union__QSEC__specific}}{}
\item\contentsline{section}{\hyperlink{union__QSEC__specific__v0}{\_\-QSEC\_\-specific\_\-v0} (Union of the context specific to each calibration mode )}{\pageref{union__QSEC__specific__v0}}{}
\item\contentsline{section}{\hyperlink{struct__QSEC__tkr}{\_\-QSEC\_\-tkr} (Tracker specific context )}{\pageref{struct__QSEC__tkr}}{}
\item\contentsline{section}{\hyperlink{struct__QSEC__tkr__v0}{\_\-QSEC\_\-tkr\_\-v0} (Tracker specific context )}{\pageref{struct__QSEC__tkr__v0}}{}
\end{CompactList}
