\hypertarget{structQSEC__acdDecompress}{
\section{QSEC\_\-acd\-Decompress Struct Reference}
\label{structQSEC__acdDecompress}\index{QSEC_acdDecompress@{QSEC\_\-acdDecompress}}
}
Private structure holding the decompression information for the ACD.  


{\tt \#include $<$expand\_\-p.h$>$}

Collaboration diagram for QSEC\_\-acd\-Decompress:\begin{figure}[H]
\begin{center}
\leavevmode
\includegraphics[width=89pt]{structQSEC__acdDecompress__coll__graph}
\end{center}
\end{figure}
\subsection*{Data Fields}
\begin{CompactItemize}
\item 
\hypertarget{structQSEC__acdDecompress_o0}{
\hyperlink{structQSEC__decompression__}{QSEC\_\-decompression} $\ast$ \hyperlink{structQSEC__acdDecompress_o0}{cables}}
\label{structQSEC__acdDecompress_o0}

\begin{CompactList}\small\item\em The electronics cable number (0-11). \item\end{CompactList}\item 
\hypertarget{structQSEC__acdDecompress_o1}{
\hyperlink{structQSEC__decompression__}{QSEC\_\-decompression} $\ast$ \hyperlink{structQSEC__acdDecompress_o1}{chns}}
\label{structQSEC__acdDecompress_o1}

\begin{CompactList}\small\item\em The channel number within a board (0-17). \item\end{CompactList}\item 
\hyperlink{structQSEC__decompression__}{QSEC\_\-decompression} $\ast$ \hyperlink{structQSEC__acdDecompress_o2}{phas}
\begin{CompactList}\small\item\em The PHA value, i.e. \item\end{CompactList}\item 
\hypertarget{structQSEC__acdDecompress_o3}{
\hyperlink{structQSEC__decompression__}{QSEC\_\-decompression} $\ast$ \hyperlink{structQSEC__acdDecompress_o3}{pvahs}}
\label{structQSEC__acdDecompress_o3}

\begin{CompactList}\small\item\em Combined state of the PHA parity error, PHA value valid flag, accept flag and hit flag. \item\end{CompactList}\end{CompactItemize}


\subsection{Detailed Description}
Private structure holding the decompression information for the ACD. 



\subsection{Field Documentation}
\hypertarget{structQSEC__acdDecompress_o2}{
\index{QSEC_acdDecompress@{QSEC\_\-acd\-Decompress}!phas@{phas}}
\index{phas@{phas}!QSEC_acdDecompress@{QSEC\_\-acd\-Decompress}}
\subsubsection[phas]{\setlength{\rightskip}{0pt plus 5cm}\hyperlink{structQSEC__decompression__}{QSEC\_\-decompression}$\ast$ \hyperlink{structQSEC__acdDecompress_o2}{QSEC\_\-acd\-Decompress::phas}}}
\label{structQSEC__acdDecompress_o2}


The PHA value, i.e. 

the ADC range plus the ADC value 

The documentation for this struct was generated from the following file:\begin{CompactItemize}
\item 
\hyperlink{expand__p_8h}{expand\_\-p.h}\end{CompactItemize}
