\section{Data Structures}
Here are the data structures with brief descriptions:\begin{CompactList}
\item\contentsline{section}{\hyperlink{struct__QSEC}{\_\-QSEC} (Structure tying together the calibration decoding context and the general event decoding context )}{\pageref{struct__QSEC}}{}
\item\contentsline{section}{\hyperlink{struct__QSEC__acd}{\_\-QSEC\_\-acd} (ACD specific context )}{\pageref{struct__QSEC__acd}}{}
\item\contentsline{section}{\hyperlink{struct__QSEC__cal}{\_\-QSEC\_\-cal} (Calorimeter specific context )}{\pageref{struct__QSEC__cal}}{}
\item\contentsline{section}{\hyperlink{struct__QSEC__channel}{\_\-QSEC\_\-channel} (Channel masking used to collect these events )}{\pageref{struct__QSEC__channel}}{}
\item\contentsline{section}{\hyperlink{struct__QSEC__ctx}{\_\-QSEC\_\-ctx} (Structure defining the complete calibration context )}{\pageref{struct__QSEC__ctx}}{}
\item\contentsline{section}{\hyperlink{struct__QSEC__global}{\_\-QSEC\_\-global} (Context of the calibration common to all modes )}{\pageref{struct__QSEC__global}}{}
\item\contentsline{section}{\hyperlink{union__QSEC__specific}{\_\-QSEC\_\-specific} (Union of the context specific to each calibration mode )}{\pageref{union__QSEC__specific}}{}
\item\contentsline{section}{\hyperlink{struct__QSEC__tkr}{\_\-QSEC\_\-tkr} (Tracker specific context )}{\pageref{struct__QSEC__tkr}}{}
\item\contentsline{section}{\hyperlink{structQSEC__acdDecompress}{QSEC\_\-acd\-Decompress} (Private structure holding the decompression information for the ACD )}{\pageref{structQSEC__acdDecompress}}{}
\item\contentsline{section}{\hyperlink{structQSEC__acdRaw}{QSEC\_\-acd\-Raw} (Private structure holding raw data for an ACD contribution )}{\pageref{structQSEC__acdRaw}}{}
\item\contentsline{section}{\hyperlink{structQSEC__calDecompress}{QSEC\_\-cal\-Decompress} (Private structure holding the decompression information for the calorimeter )}{\pageref{structQSEC__calDecompress}}{}
\item\contentsline{section}{\hyperlink{structQSEC__decompression__}{QSEC\_\-decompression\_\-} (Structure holding the tables used to decode calibration data )}{\pageref{structQSEC__decompression__}}{}
\item\contentsline{section}{\hyperlink{structQSEC__decompressionDesc}{QSEC\_\-decompression\-Desc} (Initial parameters used as part of the description of a compression structure (used when consigning the data) )}{\pageref{structQSEC__decompressionDesc}}{}
\item\contentsline{section}{\hyperlink{structQSEC__expansion__}{QSEC\_\-expansion\_\-} (Aggregation of the private decompession structures along with the arithmetic probability encoder context )}{\pageref{structQSEC__expansion__}}{}
\item\contentsline{section}{\hyperlink{structQSEC__gemDecompress}{QSEC\_\-gem\-Decompress} (Private structure holding the decompression information for the GEM )}{\pageref{structQSEC__gemDecompress}}{}
\item\contentsline{section}{\hyperlink{structQSEC__gemRaw}{QSEC\_\-gem\-Raw} (Private structure holding raw data for a GEM contribution )}{\pageref{structQSEC__gemRaw}}{}
\item\contentsline{section}{\hyperlink{structQSEC__summary}{QSEC\_\-summary} (Collection of the event builder words and event summary words from the contributors to an event )}{\pageref{structQSEC__summary}}{}
\item\contentsline{section}{\hyperlink{structQSEC__tkrDecompress}{QSEC\_\-tkr\-Decompress} (Private structure holding the decompression information for the tracker )}{\pageref{structQSEC__tkrDecompress}}{}
\end{CompactList}
