\hypertarget{struct__DgmCtl}{
\section{\_\-Dgm\-Ctl Struct Reference}
\label{struct__DgmCtl}\index{_DgmCtl@{\_\-DgmCtl}}
}
The datagram print control structure.  


Collaboration diagram for \_\-Dgm\-Ctl:\begin{figure}[H]
\begin{center}
\leavevmode
\includegraphics[width=123pt]{struct__DgmCtl__coll__graph}
\end{center}
\end{figure}
\subsection*{Data Fields}
\begin{CompactItemize}
\item 
\hyperlink{struct__DgmTable}{Dgm\-Table} $\ast$ \hyperlink{struct__DgmCtl_o0}{tbl}
\item 
\hyperlink{struct__QSD__printRto}{QSD\_\-print\-Rto} $\ast$ \hyperlink{struct__DgmCtl_o1}{rto}
\end{CompactItemize}


\subsection{Detailed Description}
The datagram print control structure. 



\subsection{Field Documentation}
\hypertarget{struct__DgmCtl_o1}{
\index{_DgmCtl@{\_\-Dgm\-Ctl}!rto@{rto}}
\index{rto@{rto}!_DgmCtl@{\_\-Dgm\-Ctl}}
\subsubsection[rto]{\setlength{\rightskip}{0pt plus 5cm}\hyperlink{struct__QSD__printRto}{QSD\_\-print\-Rto}$\ast$ \hyperlink{struct__DgmCtl_o1}{\_\-Dgm\-Ctl::rto}}}
\label{struct__DgmCtl_o1}


The run-time print options \hypertarget{struct__DgmCtl_o0}{
\index{_DgmCtl@{\_\-Dgm\-Ctl}!tbl@{tbl}}
\index{tbl@{tbl}!_DgmCtl@{\_\-Dgm\-Ctl}}
\subsubsection[tbl]{\setlength{\rightskip}{0pt plus 5cm}\hyperlink{struct__DgmTable}{Dgm\-Table}$\ast$ \hyperlink{struct__DgmCtl_o0}{\_\-Dgm\-Ctl::tbl}}}
\label{struct__DgmCtl_o0}


The datagram cache table of processors 

The documentation for this struct was generated from the following file:\begin{CompactItemize}
\item 
\hyperlink{QSD__process_8c}{QSD\_\-process.c}\end{CompactItemize}
