\hypertarget{structQPIG__dbState}{
\section{QPIG\_\-db\-State Struct Reference}
\label{structQPIG__dbState}\index{QPIG_dbState@{QPIG\_\-dbState}}
}
Structure holding the registers configured by PIG\_\-DB.  


{\tt \#include $<$state.h$>$}

\subsection*{Data Fields}
\begin{CompactItemize}
\item 
\hypertarget{structQPIG__dbState_o0}{
unsigned \hyperlink{structQPIG__dbState_o0}{ebm\_\-fe\_\-config\_\-a}}
\label{structQPIG__dbState_o0}

\begin{CompactList}\small\item\em EBM FE config A. \item\end{CompactList}\item 
\hypertarget{structQPIG__dbState_o1}{
unsigned \hyperlink{structQPIG__dbState_o1}{ebm\_\-fe\_\-config\_\-b}}
\label{structQPIG__dbState_o1}

\begin{CompactList}\small\item\em EBM FE config B. \item\end{CompactList}\item 
\hypertarget{structQPIG__dbState_o2}{
unsigned \hyperlink{structQPIG__dbState_o2}{ebm\_\-timeout}}
\label{structQPIG__dbState_o2}

\begin{CompactList}\small\item\em EBM timeout. \item\end{CompactList}\item 
\hypertarget{structQPIG__dbState_o3}{
unsigned \hyperlink{structQPIG__dbState_o3}{tem\_\-configuration} \mbox{[}QPIG\_\-N\_\-TEM\mbox{]}}
\label{structQPIG__dbState_o3}

\begin{CompactList}\small\item\em TEM configuration. \item\end{CompactList}\item 
\hypertarget{structQPIG__dbState_o4}{
unsigned \hyperlink{structQPIG__dbState_o4}{ccc\_\-event\_\-timeouts} \mbox{[}QPIG\_\-N\_\-TEM\mbox{]}\mbox{[}QPIG\_\-N\_\-CCC\mbox{]}}
\label{structQPIG__dbState_o4}

\begin{CompactList}\small\item\em CCC event timeouts. \item\end{CompactList}\item 
\hypertarget{structQPIG__dbState_o5}{
unsigned \hyperlink{structQPIG__dbState_o5}{tcc\_\-event\_\-timeouts} \mbox{[}QPIG\_\-N\_\-TEM\mbox{]}\mbox{[}QPIG\_\-N\_\-TCC\mbox{]}}
\label{structQPIG__dbState_o5}

\begin{CompactList}\small\item\em TCC event timeouts. \item\end{CompactList}\item 
\hypertarget{structQPIG__dbState_o6}{
unsigned \hyperlink{structQPIG__dbState_o6}{aem\_\-event\_\-timeout}}
\label{structQPIG__dbState_o6}

\begin{CompactList}\small\item\em AEM event timeout. \item\end{CompactList}\item 
\hypertarget{structQPIG__dbState_o7}{
unsigned \hyperlink{structQPIG__dbState_o7}{aem\_\-response\_\-timeout}}
\label{structQPIG__dbState_o7}

\begin{CompactList}\small\item\em AEM response tmo. \item\end{CompactList}\item 
\hypertarget{structQPIG__dbState_o8}{
unsigned \hyperlink{structQPIG__dbState_o8}{aem\_\-relocation}}
\label{structQPIG__dbState_o8}

\begin{CompactList}\small\item\em AEM relocation. \item\end{CompactList}\end{CompactItemize}


\subsection{Detailed Description}
Structure holding the registers configured by PIG\_\-DB. 



The documentation for this struct was generated from the following file:\begin{CompactItemize}
\item 
\hyperlink{state_8h}{state.h}\end{CompactItemize}
