\hypertarget{QPIG_8h}{
\section{QPIG.h File Reference}
\label{QPIG_8h}\index{QPIG.h@{QPIG.h}}
}
Interface to power state updating routines. 

{\tt \#include \char`\"{}QPIG/state.h\char`\"{}}\par


Include dependency graph for QPIG.h:\begin{figure}[H]
\begin{center}
\leavevmode
\includegraphics[width=145pt]{QPIG_8h__incl}
\end{center}
\end{figure}


This graph shows which files directly or indirectly include this file:\begin{figure}[H]
\begin{center}
\leavevmode
\includegraphics[width=137pt]{QPIG_8h__dep__incl}
\end{center}
\end{figure}
\subsection*{Functions}
\begin{CompactItemize}
\item 
QPIG $\ast$ \hyperlink{QPIG_8h_a0}{QPIG\_\-alloc} (void)
\begin{CompactList}\small\item\em Allocates and constructs the QPIG handle. \item\end{CompactList}\item 
void \hyperlink{QPIG_8h_a1}{QPIG\_\-update\-At\-Datagram} (QPIG $\ast$qpig, const LSF\_\-datagram $\ast$dgm)
\begin{CompactList}\small\item\em Updates the run oriented information in the event context using the information from the event datagram. \item\end{CompactList}\item 
void \hyperlink{QPIG_8h_a2}{QPIG\_\-destruct} (QPIG $\ast$qpig)
\begin{CompactList}\small\item\em Destroy the QPIG handle. \item\end{CompactList}\item 
const \hyperlink{struct__QPIG__state}{QPIG\_\-state} $\ast$ \hyperlink{QPIG_8h_a3}{QPIG\_\-app\-State\-Get} (const QPIG $\ast$qpig)
\begin{CompactList}\small\item\em Return a pointer to the public QPIG application specific context block. \item\end{CompactList}\item 
unsigned int \hyperlink{QPIG_8h_a4}{QPIG\_\-sizeof} (void $\ast$prm)
\begin{CompactList}\small\item\em Returns the size, in bytes, of the handle for updating the standard event meta-information. \item\end{CompactList}\item 
QPIG $\ast$ \hyperlink{QPIG_8h_a5}{QPIG\_\-construct} (QPIG $\ast$qpig, void $\ast$prm)
\begin{CompactList}\small\item\em Construct (initializes) the handle for updating the standard event meta-information. \item\end{CompactList}\end{CompactItemize}


\subsection{Detailed Description}
Interface to power state updating routines. 

\begin{Desc}
\item[Author:]\href{mailto:jswain@slac.stanford.edu}{\tt jswain@slac.stanford.edu}\end{Desc}


\footnotesize\begin{verbatim}   CVS $Id: QPIG.h,v 1.2 2006/04/11 17:20:00 jswain Exp $
\end{verbatim}
\normalsize


\subsection{Function Documentation}
\hypertarget{QPIG_8h_a0}{
\index{QPIG.h@{QPIG.h}!QPIG_alloc@{QPIG\_\-alloc}}
\index{QPIG_alloc@{QPIG\_\-alloc}!QPIG.h@{QPIG.h}}
\subsubsection[QPIG\_\-alloc]{\setlength{\rightskip}{0pt plus 5cm}QPIG$\ast$ QPIG\_\-alloc (void)}}
\label{QPIG_8h_a0}


Allocates and constructs the QPIG handle. 

\begin{Desc}
\item[Returns:]A pointer to the allocated and constructed QPIG handle\end{Desc}
\hypertarget{QPIG_8h_a3}{
\index{QPIG.h@{QPIG.h}!QPIG_appStateGet@{QPIG\_\-appStateGet}}
\index{QPIG_appStateGet@{QPIG\_\-appStateGet}!QPIG.h@{QPIG.h}}
\subsubsection[QPIG\_\-appStateGet]{\setlength{\rightskip}{0pt plus 5cm}const \hyperlink{struct__QPIG__state}{QPIG\_\-state}$\ast$ QPIG\_\-app\-State\-Get (const QPIG $\ast$ {\em qpig})}}
\label{QPIG_8h_a3}


Return a pointer to the public QPIG application specific context block. 

\begin{Desc}
\item[Returns:]A pointer to the QPIG application specific context block\end{Desc}
\begin{Desc}
\item[Parameters:]
\begin{description}
\item[{\em qpig}]The calibration event handle\end{description}
\end{Desc}
\begin{Desc}
\item[]This routine is just an accessor to keep the structure of QPIG private.\end{Desc}
\hypertarget{QPIG_8h_a5}{
\index{QPIG.h@{QPIG.h}!QPIG_construct@{QPIG\_\-construct}}
\index{QPIG_construct@{QPIG\_\-construct}!QPIG.h@{QPIG.h}}
\subsubsection[QPIG\_\-construct]{\setlength{\rightskip}{0pt plus 5cm}QPIG$\ast$ QPIG\_\-construct (QPIG $\ast$ {\em qpig}, void $\ast$ {\em prm})}}
\label{QPIG_8h_a5}


Construct (initializes) the handle for updating the standard event meta-information. 

\begin{Desc}
\item[Returns:]The QSEP context structure\end{Desc}
\begin{Desc}
\item[Parameters:]
\begin{description}
\item[{\em qpig}]The handle to initialize, if specified as NULL, one will be allocated \item[{\em prm}]A run-time set parameter used to stylize the configuration\end{description}
\end{Desc}
\hypertarget{QPIG_8h_a2}{
\index{QPIG.h@{QPIG.h}!QPIG_destruct@{QPIG\_\-destruct}}
\index{QPIG_destruct@{QPIG\_\-destruct}!QPIG.h@{QPIG.h}}
\subsubsection[QPIG\_\-destruct]{\setlength{\rightskip}{0pt plus 5cm}void QPIG\_\-destruct (QPIG $\ast$ {\em qpig})}}
\label{QPIG_8h_a2}


Destroy the QPIG handle. 

\begin{Desc}
\item[Parameters:]
\begin{description}
\item[{\em qpig}]Pointer to the QPIG handle to delete.\end{description}
\end{Desc}
\hypertarget{QPIG_8h_a4}{
\index{QPIG.h@{QPIG.h}!QPIG_sizeof@{QPIG\_\-sizeof}}
\index{QPIG_sizeof@{QPIG\_\-sizeof}!QPIG.h@{QPIG.h}}
\subsubsection[QPIG\_\-sizeof]{\setlength{\rightskip}{0pt plus 5cm}unsigned int QPIG\_\-sizeof (void $\ast$ {\em prm})}}
\label{QPIG_8h_a4}


Returns the size, in bytes, of the handle for updating the standard event meta-information. 

\begin{Desc}
\item[Returns:]The size, in bytes, of the handle for updating the standard event meta-information\end{Desc}
\begin{Desc}
\item[Parameters:]
\begin{description}
\item[{\em prm}]A run-time set parameter used to stylize the configuration\end{description}
\end{Desc}
\hypertarget{QPIG_8h_a1}{
\index{QPIG.h@{QPIG.h}!QPIG_updateAtDatagram@{QPIG\_\-updateAtDatagram}}
\index{QPIG_updateAtDatagram@{QPIG\_\-updateAtDatagram}!QPIG.h@{QPIG.h}}
\subsubsection[QPIG\_\-updateAtDatagram]{\setlength{\rightskip}{0pt plus 5cm}void QPIG\_\-update\-At\-Datagram (QPIG $\ast$ {\em qpig}, const LSF\_\-datagram $\ast$ {\em dgm})}}
\label{QPIG_8h_a1}


Updates the run oriented information in the event context using the information from the event datagram. 

\begin{Desc}
\item[Parameters:]
\begin{description}
\item[{\em qpig}]The calibration event handle \item[{\em dgm}]The event datagram\end{description}
\end{Desc}
