\hypertarget{struct__QPIG}{
\section{\_\-QPIG Struct Reference}
\label{struct__QPIG}\index{_QPIG@{\_\-QPIG}}
}
Structure tying together the calibration decoding context and the general event decoding context.  


{\tt \#include $<$QPIG\_\-p.h$>$}

\subsection*{Data Fields}
\begin{CompactItemize}
\item 
\hypertarget{struct__QPIG_o0}{
\hyperlink{structQPIG__state}{QPIG\_\-state} \hyperlink{struct__QPIG_o0}{state}}
\label{struct__QPIG_o0}

\begin{CompactList}\small\item\em Power register state. \item\end{CompactList}\item 
\hypertarget{struct__QPIG_o1}{
int \hyperlink{struct__QPIG_o1}{free}}
\label{struct__QPIG_o1}

\begin{CompactList}\small\item\em Flag indicating whether to free this structure. \item\end{CompactList}\end{CompactItemize}


\subsection{Detailed Description}
Structure tying together the calibration decoding context and the general event decoding context. 



The documentation for this struct was generated from the following file:\begin{CompactItemize}
\item 
\hyperlink{QPIG__p_8h}{QPIG\_\-p.h}\end{CompactItemize}
