\hypertarget{struct__QASC}{
\section{\_\-QASC Struct Reference}
\label{struct__QASC}\index{_QASC@{\_\-QASC}}
}
Structure of the ASC data that is used when presenting a public interface.  


{\tt \#include $<$QASC\_\-pvtdefs.h$>$}

Collaboration diagram for \_\-QASC:\begin{figure}[H]
\begin{center}
\leavevmode
\includegraphics[width=280pt]{struct__QASC__coll__graph}
\end{center}
\end{figure}
\subsection*{Data Fields}
\begin{CompactItemize}
\item 
\hyperlink{struct__QEMP__hdr}{QEMP\_\-hdr} \hyperlink{struct__QASC_o0}{hdr}
\item 
\hyperlink{struct__QASC__stats}{QASC\_\-stats} \hyperlink{struct__QASC_o1}{stats}
\item 
\hyperlink{struct__QASC__data}{QASC\_\-data} \hyperlink{struct__QASC_o2}{data}
\end{CompactItemize}


\subsection{Detailed Description}
Structure of the ASC data that is used when presenting a public interface. 



\subsection{Field Documentation}
\hypertarget{struct__QASC_o2}{
\index{_QASC@{\_\-QASC}!data@{data}}
\index{data@{data}!_QASC@{\_\-QASC}}
\subsubsection[data]{\setlength{\rightskip}{0pt plus 5cm}\hyperlink{struct__QASC__data}{QASC\_\-data} \hyperlink{struct__QASC_o2}{\_\-QASC::data}}}
\label{struct__QASC_o2}


The data itself \hypertarget{struct__QASC_o0}{
\index{_QASC@{\_\-QASC}!hdr@{hdr}}
\index{hdr@{hdr}!_QASC@{\_\-QASC}}
\subsubsection[hdr]{\setlength{\rightskip}{0pt plus 5cm}\hyperlink{struct__QEMP__hdr}{QEMP\_\-hdr} \hyperlink{struct__QASC_o0}{\_\-QASC::hdr}}}
\label{struct__QASC_o0}


The standard monitor header \hypertarget{struct__QASC_o1}{
\index{_QASC@{\_\-QASC}!stats@{stats}}
\index{stats@{stats}!_QASC@{\_\-QASC}}
\subsubsection[stats]{\setlength{\rightskip}{0pt plus 5cm}\hyperlink{struct__QASC__stats}{QASC\_\-stats} \hyperlink{struct__QASC_o1}{\_\-QASC::stats}}}
\label{struct__QASC_o1}


The ASC specific monitoring statistics 

The documentation for this struct was generated from the following file:\begin{CompactItemize}
\item 
\hyperlink{QASC__pvtdefs_8h}{QASC\_\-pvtdefs.h}\end{CompactItemize}
