\hypertarget{struct__ApidStream}{
\section{\_\-ApidStream Struct Reference}
\label{struct__ApidStream}\index{\_\-ApidStream@{\_\-ApidStream}}
}
The print context for one APID.  


{\tt \#include $<$dump\_\-p.h$>$}

\subsection*{Public Attributes}
\begin{CompactItemize}
\item 
\hypertarget{struct__ApidStream_a4f881db35fff8cb9f4977cf600ecd46}{
int \hyperlink{struct__ApidStream_a4f881db35fff8cb9f4977cf600ecd46}{dgmid}}
\label{struct__ApidStream_a4f881db35fff8cb9f4977cf600ecd46}

\begin{CompactList}\small\item\em The datagram ID for this stream. \item\end{CompactList}\item 
\hypertarget{struct__ApidStream_e1163cf3c9df8dfe62ffd367ffd05e34}{
CCSDS\_\-apidDsc \hyperlink{struct__ApidStream_e1163cf3c9df8dfe62ffd367ffd05e34}{dsc}}
\label{struct__ApidStream_e1163cf3c9df8dfe62ffd367ffd05e34}

\begin{CompactList}\small\item\em The Apid descriptor. \item\end{CompactList}\item 
\hypertarget{struct__ApidStream_9d4cf3a89122b3f87e7afc05eac551bd}{
unsigned char $\ast$ \hyperlink{struct__ApidStream_9d4cf3a89122b3f87e7afc05eac551bd}{dsc\_\-buf}}
\label{struct__ApidStream_9d4cf3a89122b3f87e7afc05eac551bd}

\begin{CompactList}\small\item\em The read buffer. \item\end{CompactList}\item 
\hypertarget{struct__ApidStream_01a041dbaafaa75763b931a6d123d65c}{
\hyperlink{dump_8h_8e926564ce86707cd6ce78d51ab3c47e}{DUMP\_\-dgmHandler} $\ast$ \hyperlink{struct__ApidStream_01a041dbaafaa75763b931a6d123d65c}{dgm\_\-handler}}
\label{struct__ApidStream_01a041dbaafaa75763b931a6d123d65c}

\begin{CompactList}\small\item\em Function to handle datagrams. \item\end{CompactList}\item 
\hypertarget{struct__ApidStream_d4f3d08e4de0dccb92a3b3c5ebb45eb4}{
void $\ast$ \hyperlink{struct__ApidStream_d4f3d08e4de0dccb92a3b3c5ebb45eb4}{rsrc}}
\label{struct__ApidStream_d4f3d08e4de0dccb92a3b3c5ebb45eb4}

\begin{CompactList}\small\item\em Application specific resources. \item\end{CompactList}\item 
\hypertarget{struct__ApidStream_35fe14eb548302ceb6249d41f7247baf}{
unsigned int \hyperlink{struct__ApidStream_35fe14eb548302ceb6249d41f7247baf}{secs}}
\label{struct__ApidStream_35fe14eb548302ceb6249d41f7247baf}

\begin{CompactList}\small\item\em Seconds from last packet. \item\end{CompactList}\item 
\hypertarget{struct__ApidStream_b0f63185bccac343ca4badc75f16ce0a}{
unsigned int \hyperlink{struct__ApidStream_b0f63185bccac343ca4badc75f16ce0a}{usecs}}
\label{struct__ApidStream_b0f63185bccac343ca4badc75f16ce0a}

\begin{CompactList}\small\item\em Microseconds from last packet. \item\end{CompactList}\end{CompactItemize}


\subsection{Detailed Description}
The print context for one APID. 

The documentation for this struct was generated from the following file:\begin{CompactItemize}
\item 
\hyperlink{dump__p_8h}{dump\_\-p.h}\end{CompactItemize}
