\hypertarget{struct__ApidStream}{
\section{\_\-Apid\-Stream Struct Reference}
\label{struct__ApidStream}\index{_ApidStream@{\_\-ApidStream}}
}
The print context for one APID.  


{\tt \#include $<$dump\_\-p.h$>$}

\subsection*{Data Fields}
\begin{CompactItemize}
\item 
int \hyperlink{struct__ApidStream_o0}{dgmid}
\item 
CCSDS\_\-apid\-Dsc \hyperlink{struct__ApidStream_o1}{dsc}
\item 
unsigned char $\ast$ \hyperlink{struct__ApidStream_o2}{dsc\_\-buf}
\item 
\hyperlink{dump_8h_a1}{DUMP\_\-dgm\-Handler} $\ast$ \hyperlink{struct__ApidStream_o3}{dgm\_\-handler}
\item 
void $\ast$ \hyperlink{struct__ApidStream_o4}{rsrc}
\end{CompactItemize}


\subsection{Detailed Description}
The print context for one APID. 



\subsection{Field Documentation}
\hypertarget{struct__ApidStream_o3}{
\index{_ApidStream@{\_\-Apid\-Stream}!dgm_handler@{dgm\_\-handler}}
\index{dgm_handler@{dgm\_\-handler}!_ApidStream@{\_\-Apid\-Stream}}
\subsubsection[dgm\_\-handler]{\setlength{\rightskip}{0pt plus 5cm}\hyperlink{dump_8h_a1}{DUMP\_\-dgm\-Handler}$\ast$ \hyperlink{struct__ApidStream_o3}{\_\-Apid\-Stream::dgm\_\-handler}}}
\label{struct__ApidStream_o3}


Function to handle datagrams \hypertarget{struct__ApidStream_o0}{
\index{_ApidStream@{\_\-Apid\-Stream}!dgmid@{dgmid}}
\index{dgmid@{dgmid}!_ApidStream@{\_\-Apid\-Stream}}
\subsubsection[dgmid]{\setlength{\rightskip}{0pt plus 5cm}int \hyperlink{struct__ApidStream_o0}{\_\-Apid\-Stream::dgmid}}}
\label{struct__ApidStream_o0}


The datagram ID for this stream \hypertarget{struct__ApidStream_o1}{
\index{_ApidStream@{\_\-Apid\-Stream}!dsc@{dsc}}
\index{dsc@{dsc}!_ApidStream@{\_\-Apid\-Stream}}
\subsubsection[dsc]{\setlength{\rightskip}{0pt plus 5cm}CCSDS\_\-apid\-Dsc \hyperlink{struct__ApidStream_o1}{\_\-Apid\-Stream::dsc}}}
\label{struct__ApidStream_o1}


The Apid descriptor \hypertarget{struct__ApidStream_o2}{
\index{_ApidStream@{\_\-Apid\-Stream}!dsc_buf@{dsc\_\-buf}}
\index{dsc_buf@{dsc\_\-buf}!_ApidStream@{\_\-Apid\-Stream}}
\subsubsection[dsc\_\-buf]{\setlength{\rightskip}{0pt plus 5cm}unsigned char$\ast$ \hyperlink{struct__ApidStream_o2}{\_\-Apid\-Stream::dsc\_\-buf}}}
\label{struct__ApidStream_o2}


The read buffer \hypertarget{struct__ApidStream_o4}{
\index{_ApidStream@{\_\-Apid\-Stream}!rsrc@{rsrc}}
\index{rsrc@{rsrc}!_ApidStream@{\_\-Apid\-Stream}}
\subsubsection[rsrc]{\setlength{\rightskip}{0pt plus 5cm}void$\ast$ \hyperlink{struct__ApidStream_o4}{\_\-Apid\-Stream::rsrc}}}
\label{struct__ApidStream_o4}


Application specific resources 

The documentation for this struct was generated from the following file:\begin{CompactItemize}
\item 
\hyperlink{dump__p_8h}{dump\_\-p.h}\end{CompactItemize}
