\section{File List}
Here is a list of all documented files with brief descriptions:\begin{CompactList}
\item\contentsline{section}{\hyperlink{Dfi-Acd_8hh}{Dfi-Acd.hh} (Enumerates fundamental constants of the ACD )}{\pageref{Dfi-Acd_8hh}}{}
\item\contentsline{section}{\hyperlink{Dfi-CheckMacros_8hh}{Dfi-CheckMacros.hh} (Defines a set of macros which checks consistency between Q-defined structures and their DFI equivalents )}{\pageref{Dfi-CheckMacros_8hh}}{}
\item\contentsline{section}{\hyperlink{DfiLpa-DgnHandler_8hh}{DfiLpa-DgnHandler.hh} (The Diagnostic Event Handler specific class )}{\pageref{DfiLpa-DgnHandler_8hh}}{}
\item\contentsline{section}{\hyperlink{DfiLpa-DgnHandlerCheck_8cc}{DfiLpa-DgnHandlerCheck.cc} (Checks the DFI definitions for consistency with the QGFC versions )}{\pageref{DfiLpa-DgnHandlerCheck_8cc}}{}
\item\contentsline{section}{\hyperlink{DfiLpa-EventHandler_8hh}{DfiLpa-EventHandler.hh} (Defines the access to the generic event handler attributes )}{\pageref{DfiLpa-EventHandler_8hh}}{}
\item\contentsline{section}{\hyperlink{DfiLpa-GammaHandler_8hh}{DfiLpa-GammaHandler.hh} (The Gamma Event Handler specific class )}{\pageref{DfiLpa-GammaHandler_8hh}}{}
\item\contentsline{section}{\hyperlink{DfiLpa-GammaHandlerCheck_8cc}{DfiLpa-GammaHandlerCheck.cc} (Checks the DFI definitions for consistency with the QGFC versions )}{\pageref{DfiLpa-GammaHandlerCheck_8cc}}{}
\item\contentsline{section}{\hyperlink{DfiLpa-HipHandler_8hh}{DfiLpa-HipHandler.hh} (The Heavy Ion Event Handler specific class )}{\pageref{DfiLpa-HipHandler_8hh}}{}
\item\contentsline{section}{\hyperlink{DfiLpa-HipHandlerCheck_8cc}{DfiLpa-HipHandlerCheck.cc} (Checks the DFI definitions for consistency with the QGFC versions )}{\pageref{DfiLpa-HipHandlerCheck_8cc}}{}
\item\contentsline{section}{\hyperlink{DfiLpa-MipHandler_8hh}{DfiLpa-MipHandler.hh} (The Minimum Ionizing Event Handler specific class )}{\pageref{DfiLpa-MipHandler_8hh}}{}
\item\contentsline{section}{\hyperlink{DfiLpa-MipHandlerCheck_8cc}{DfiLpa-MipHandlerCheck.cc} (Checks the DFI definitions for consistency with the QGFC versions )}{\pageref{DfiLpa-MipHandlerCheck_8cc}}{}
\item\contentsline{section}{\hyperlink{DfiLpa-StatsAscMonitor_8hh}{DfiLpa-StatsAscMonitor.hh} (The ACD Software Counter Monitoring Class. This class was used to monitor the performance of the embedded software. Except for FSW types, it should likely be ignore by others )}{\pageref{DfiLpa-StatsAscMonitor_8hh}}{}
\item\contentsline{section}{\hyperlink{DfiLpa-StatsAscSample_8hh}{DfiLpa-StatsAscSample.hh} (One ACD Software Counter statistics sample )}{\pageref{DfiLpa-StatsAscSample_8hh}}{}
\item\contentsline{section}{\hyperlink{DfiLpa-StatsAscStatistics_8hh}{DfiLpa-StatsAscStatistics.hh} (The ACD Software Counter Statistics )}{\pageref{DfiLpa-StatsAscStatistics_8hh}}{}
\item\contentsline{section}{\hyperlink{DfiLpa-StatsPoint_8hh}{DfiLpa-StatsPoint.hh} (Defines one (either the beginning or ending) sample point of a statistics sample )}{\pageref{DfiLpa-StatsPoint_8hh}}{}
\item\contentsline{section}{\hyperlink{DfiLpa-StatsSpan_8hh}{DfiLpa-StatsSpan.hh} (Defines span, both the beginning or ending and some global properties of a sample statistics sample )}{\pageref{DfiLpa-StatsSpan_8hh}}{}
\item\contentsline{section}{\hyperlink{DfiLpa-StatsStdSample_8hh}{DfiLpa-StatsStdSample.hh} (Makes a buffered copy of the statistics sample from either a DfiLpaStatsSample (and all the related classes) or a \_\-QSSP\_\-sample structures )}{\pageref{DfiLpa-StatsStdSample_8hh}}{}
\item\contentsline{section}{\hyperlink{DfiLpa-StatsStdStatistics_8hh}{DfiLpa-StatsStdStatistics.hh} (Makes a buffered copy of the statistics buffer from either a DfiLpaStatsStdStatistics (and all the related classes) or a \_\-QSSP\_\-statistics structures )}{\pageref{DfiLpa-StatsStdStatistics_8hh}}{}
\end{CompactList}
