\hypertarget{dir_19b52a533981bb477576fd60082e752c}{
\section{/afs/slac.stanford.edu/g/glast/flight/QSD/source/DFI/dev/DFI/ Directory Reference}
\label{dir_19b52a533981bb477576fd60082e752c}\index{/afs/slac.stanford.edu/g/glast/flight/QSD/source/DFI/dev/DFI/ Directory Reference@{/afs/slac.stanford.edu/g/glast/flight/QSD/source/DFI/dev/DFI/ Directory Reference}}
}
\subsection*{Files}
\begin{CompactItemize}
\item 
file \hyperlink{Dfi-Acd_8hh}{Dfi-Acd.hh}
\begin{CompactList}\small\item\em Enumerates fundamental constants of the ACD. \item\end{CompactList}

\item 
file \hyperlink{DfiLpa-DgnHandler_8hh}{DfiLpa-DgnHandler.hh}
\begin{CompactList}\small\item\em The Diagnostic Event Handler specific class. \item\end{CompactList}

\item 
file \hyperlink{DfiLpa-EventHandler_8hh}{DfiLpa-EventHandler.hh}
\begin{CompactList}\small\item\em Defines the access to the generic event handler attributes. \item\end{CompactList}

\item 
file \hyperlink{DfiLpa-GammaHandler_8hh}{DfiLpa-GammaHandler.hh}
\begin{CompactList}\small\item\em The Gamma Event Handler specific class. \item\end{CompactList}

\item 
file \hyperlink{DfiLpa-HipHandler_8hh}{DfiLpa-HipHandler.hh}
\begin{CompactList}\small\item\em The Heavy Ion Event Handler specific class. \item\end{CompactList}

\item 
file \hyperlink{DfiLpa-MipHandler_8hh}{DfiLpa-MipHandler.hh}
\begin{CompactList}\small\item\em The Minimum Ionizing Event Handler specific class. \item\end{CompactList}

\item 
file \hyperlink{DfiLpa-StatsAscMonitor_8hh}{DfiLpa-StatsAscMonitor.hh}
\begin{CompactList}\small\item\em The ACD Software Counter Monitoring Class. This class was used to monitor the performance of the embedded software. Except for FSW types, it should likely be ignore by others. \item\end{CompactList}

\item 
file \hyperlink{DfiLpa-StatsAscSample_8hh}{DfiLpa-StatsAscSample.hh}
\begin{CompactList}\small\item\em One ACD Software Counter statistics sample. \item\end{CompactList}

\item 
file \hyperlink{DfiLpa-StatsAscStatistics_8hh}{DfiLpa-StatsAscStatistics.hh}
\begin{CompactList}\small\item\em The ACD Software Counter Statistics. \item\end{CompactList}

\item 
file \hyperlink{DfiLpa-StatsPoint_8hh}{DfiLpa-StatsPoint.hh}
\begin{CompactList}\small\item\em Defines one (either the beginning or ending) sample point of a statistics sample. \item\end{CompactList}

\item 
file \hyperlink{DfiLpa-StatsSpan_8hh}{DfiLpa-StatsSpan.hh}
\begin{CompactList}\small\item\em Defines span, both the beginning or ending and some global properties of a sample statistics sample. \item\end{CompactList}

\item 
file \hyperlink{DfiLpa-StatsStdSample_8hh}{DfiLpa-StatsStdSample.hh}
\begin{CompactList}\small\item\em Makes a buffered copy of the statistics sample from either a DfiLpaStatsSample (and all the related classes) or a \_\-QSSP\_\-sample structures. \item\end{CompactList}

\item 
file \hyperlink{DfiLpa-StatsStdStatistics_8hh}{DfiLpa-StatsStdStatistics.hh}
\begin{CompactList}\small\item\em Makes a buffered copy of the statistics buffer from either a DfiLpaStatsStdStatistics (and all the related classes) or a \_\-QSSP\_\-statistics structures. \item\end{CompactList}

\end{CompactItemize}
