\hypertarget{dir_82005f7f3fc7257ebb980317009c409c}{
\section{/afs/slac.stanford.edu/g/glast/flight/QSD/source/DFI/V5-2-2/src/ Directory Reference}
\label{dir_82005f7f3fc7257ebb980317009c409c}\index{/afs/slac.stanford.edu/g/glast/flight/QSD/source/DFI/V5-2-2/src/ Directory Reference@{/afs/slac.stanford.edu/g/glast/flight/QSD/source/DFI/V5-2-2/src/ Directory Reference}}
}
\subsection*{Files}
\begin{CompactItemize}
\item 
file \hyperlink{Dfi-CheckMacros_8hh}{Dfi-CheckMacros.hh}
\begin{CompactList}\small\item\em Defines a set of macros which checks consistency between Q-defined structures and their DFI equivalents. \item\end{CompactList}

\item 
file \hyperlink{DfiLpa-DgnHandlerCheck_8cc}{DfiLpa-DgnHandlerCheck.cc}
\begin{CompactList}\small\item\em Checks the DFI definitions for consistency with the QGFC versions. \item\end{CompactList}

\item 
file \hyperlink{DfiLpa-GammaHandlerCheck_8cc}{DfiLpa-GammaHandlerCheck.cc}
\begin{CompactList}\small\item\em Checks the DFI definitions for consistency with the QGFC versions. \item\end{CompactList}

\item 
file \hyperlink{DfiLpa-HipHandlerCheck_8cc}{DfiLpa-HipHandlerCheck.cc}
\begin{CompactList}\small\item\em Checks the DFI definitions for consistency with the QGFC versions. \item\end{CompactList}

\item 
file \hyperlink{DfiLpa-MipHandlerCheck_8cc}{DfiLpa-MipHandlerCheck.cc}
\begin{CompactList}\small\item\em Checks the DFI definitions for consistency with the QGFC versions. \item\end{CompactList}

\end{CompactItemize}
