\hypertarget{dir_000008}{
\section{/afs/slac.stanford.edu/g/glast/flight/QSD/source/DFI/V5-1-0/src/ Directory Reference}
\label{dir_000008}\index{/afs/slac.stanford.edu/g/glast/flight/QSD/source/DFI/V5-1-0/src/ Directory Reference@{/afs/slac.stanford.edu/g/glast/flight/QSD/source/DFI/V5-1-0/src/ Directory Reference}}
}


\begin{figure}[H]
\begin{center}
\leavevmode
\includegraphics[width=61pt]{dir_000008_dep}
\end{center}
\end{figure}
\subsection*{Files}
\begin{CompactItemize}
\item 
file \hyperlink{Dfi-CheckMacros_8hh}{Dfi-Check\-Macros.hh}
\begin{CompactList}\small\item\em Defines a set of macros which checks consistency between Q-defined structures and their DFI equivalents. \item\end{CompactList}

\item 
file \hyperlink{DfiLpa-DgnHandlerCheck_8cc}{Dfi\-Lpa-Dgn\-Handler\-Check.cc}
\begin{CompactList}\small\item\em Checks the DFI definitions for consistency with the QGFC versions. \item\end{CompactList}

\item 
file \hyperlink{DfiLpa-GammaHandlerCheck_8cc}{Dfi\-Lpa-Gamma\-Handler\-Check.cc}
\begin{CompactList}\small\item\em Checks the DFI definitions for consistency with the QGFC versions. \item\end{CompactList}

\item 
file \hyperlink{DfiLpa-HipHandlerCheck_8cc}{Dfi\-Lpa-Hip\-Handler\-Check.cc}
\begin{CompactList}\small\item\em Checks the DFI definitions for consistency with the QGFC versions. \item\end{CompactList}

\item 
file \hyperlink{DfiLpa-MipHandlerCheck_8cc}{Dfi\-Lpa-Mip\-Handler\-Check.cc}
\begin{CompactList}\small\item\em Checks the DFI definitions for consistency with the QGFC versions. \item\end{CompactList}

\end{CompactItemize}
