\hypertarget{struct__RestartPkt}{
\section{\_\-Restart\-Pkt Struct Reference}
\label{struct__RestartPkt}\index{_RestartPkt@{\_\-RestartPkt}}
}
Defines an EBF restart packet.  


\subsection*{Data Fields}
\begin{CompactItemize}
\item 
EBF\_\-pkt\-Hdr \hyperlink{struct__RestartPkt_o0}{hdr}
\item 
EBF\_\-pkt\-Restart\-Cell \hyperlink{struct__RestartPkt_o1}{cell}
\end{CompactItemize}


\subsection{Detailed Description}
Defines an EBF restart packet. 



\subsection{Field Documentation}
\hypertarget{struct__RestartPkt_o1}{
\index{_RestartPkt@{\_\-Restart\-Pkt}!cell@{cell}}
\index{cell@{cell}!_RestartPkt@{\_\-Restart\-Pkt}}
\subsubsection[cell]{\setlength{\rightskip}{0pt plus 5cm}EBF\_\-pkt\-Restart\-Cell \hyperlink{struct__RestartPkt_o1}{\_\-Restart\-Pkt::cell}}}
\label{struct__RestartPkt_o1}


Standard restart cell \hypertarget{struct__RestartPkt_o0}{
\index{_RestartPkt@{\_\-Restart\-Pkt}!hdr@{hdr}}
\index{hdr@{hdr}!_RestartPkt@{\_\-Restart\-Pkt}}
\subsubsection[hdr]{\setlength{\rightskip}{0pt plus 5cm}EBF\_\-pkt\-Hdr \hyperlink{struct__RestartPkt_o0}{\_\-Restart\-Pkt::hdr}}}
\label{struct__RestartPkt_o0}


Standard packet header 

The documentation for this struct was generated from the following file:\begin{CompactItemize}
\item 
\hyperlink{xfc__ebf__output_8c}{xfc\_\-ebf\_\-output.c}\end{CompactItemize}
