\hypertarget{dir_4a5dd01c89212721154f9220adc489a9}{
\section{/afs/slac.stanford.edu/g/glast/flight/PHY/source/XFC/V0-3-1/XFC/ Directory Reference}
\label{dir_4a5dd01c89212721154f9220adc489a9}\index{/afs/slac.stanford.edu/g/glast/flight/PHY/source/XFC/V0-3-1/XFC/ Directory Reference@{/afs/slac.stanford.edu/g/glast/flight/PHY/source/XFC/V0-3-1/XFC/ Directory Reference}}
}
\subsection*{Files}
\begin{CompactItemize}
\item 
file \hyperlink{MFC_8h}{MFC.h}
\begin{CompactList}\small\item\em Minimum Ionizing Particle (MIP) Filter Code, Interface. \item\end{CompactList}

\item 
file \hyperlink{MFC__cfg_8h}{MFC\_\-cfg.h}
\begin{CompactList}\small\item\em Defines the interface to and data structure containing the parameters used in minimum ionizing particles. This is just a front for the most current version of the parameters. \item\end{CompactList}

\item 
file \hyperlink{MFC__stats_8h}{MFC\_\-stats.h}
\begin{CompactList}\small\item\em Defines the interface for summarizing the event-by-event results of the filtering process into a statistics table. \item\end{CompactList}

\item 
file \hyperlink{MFC__status_8h}{MFC\_\-status.h}
\begin{CompactList}\small\item\em Defines the Minimum Ionizing Particle (MIP) Filter status bits. \item\end{CompactList}

\end{CompactItemize}
