\hypertarget{dir_4fb4bc81059e367fe28b6811d5b6c121}{
\section{/afs/slac.stanford.edu/g/glast/flight/PHY/source/XFC/V0-3-1/src/ Directory Reference}
\label{dir_4fb4bc81059e367fe28b6811d5b6c121}\index{/afs/slac.stanford.edu/g/glast/flight/PHY/source/XFC/V0-3-1/src/ Directory Reference@{/afs/slac.stanford.edu/g/glast/flight/PHY/source/XFC/V0-3-1/src/ Directory Reference}}
}
\subsection*{Files}
\begin{CompactItemize}
\item 
file \hyperlink{HFC_8c}{HFC.c}
\begin{CompactList}\small\item\em Heavy Ion Filter Code. \item\end{CompactList}

\item 
file \hyperlink{HFC__dbConfigure_8c}{HFC\_\-dbConfigure.c}
\begin{CompactList}\small\item\em Uses an EDS\_\-DB\_\-schema to configure the Heavy Ion (CNO) filter. \item\end{CompactList}

\item 
file \hyperlink{HFC__def_8h}{HFC\_\-def.h}
\begin{CompactList}\small\item\em Wraps the entire filter context into one structure, suitable for passing to the LCB call back routine. \item\end{CompactList}

\item 
file \hyperlink{HFC__resultDef_8h}{HFC\_\-resultDef.h}
\begin{CompactList}\small\item\em Defines the data structure for summarizing the event-by-event results of the heavy ion filtering process. \item\end{CompactList}

\item 
file \hyperlink{HFC__stats_8c}{HFC\_\-stats.c}
\begin{CompactList}\small\item\em Provides routines to clear and accumulate and the summary statistics of the heavy ion filtering process. \item\end{CompactList}

\item 
file \hyperlink{HFC__statsDef_8h}{HFC\_\-statsDef.h}
\begin{CompactList}\small\item\em Defines the statistics structure that summarizes the event-by-event results of the heavy ion filtering process. \item\end{CompactList}

\item 
file \hyperlink{TOV_8h}{TOV.h}
\begin{CompactList}\small\item\em Tests that any errors in the event are only of the TKR overflow variety. \item\end{CompactList}

\end{CompactItemize}
