\section{File List}
Here is a list of all documented files with brief descriptions:\begin{CompactList}
\item\contentsline{section}{\hyperlink{MFC_8c}{MFC.c} (Minimum Ionizing Particle Filter Code )}{\pageref{MFC_8c}}{}
\item\contentsline{section}{\hyperlink{MFC_8h}{MFC.h} (Minimum Ionizing Particle (MIP) Filter Code, Interface )}{\pageref{MFC_8h}}{}
\item\contentsline{section}{\hyperlink{MFC__cfg_8h}{MFC\_\-cfg.h} (Defines the interface to and data structure containing the parameters used in minimum ionizing particles. This is just a front for the most current version of the parameters )}{\pageref{MFC__cfg_8h}}{}
\item\contentsline{section}{\hyperlink{MFC__dbConfigure_8c}{MFC\_\-dbConfigure.c} (Uses an EDS\_\-DB\_\-schema to configure the Minimum Ionizing Particle (MIP) filter )}{\pageref{MFC__dbConfigure_8c}}{}
\item\contentsline{section}{\hyperlink{MFC__def_8h}{MFC\_\-def.h} (Wraps the entire filter context into one structure, suitable for passing to the LCB call back routine )}{\pageref{MFC__def_8h}}{}
\item\contentsline{section}{\hyperlink{MFC__resultDef_8h}{MFC\_\-resultDef.h} (Defines the data structure for summarizing the event-by-event results of the Minimum Ionizig Particle filtering process )}{\pageref{MFC__resultDef_8h}}{}
\item\contentsline{section}{\hyperlink{MFC__stats_8c}{MFC\_\-stats.c} (Provides routines to clear and accumulate and the summary statistics of the Minimum Ionizing Particle filtering process )}{\pageref{MFC__stats_8c}}{}
\item\contentsline{section}{\hyperlink{MFC__stats_8h}{MFC\_\-stats.h} (Defines the interface for summarizing the event-by-event results of the filtering process into a statistics table )}{\pageref{MFC__stats_8h}}{}
\item\contentsline{section}{\hyperlink{MFC__statsDef_8h}{MFC\_\-statsDef.h} (Defines the statistics structure that summarizes the event-by-event results of the Minimum Ionizing Particle filtering process )}{\pageref{MFC__statsDef_8h}}{}
\item\contentsline{section}{\hyperlink{MFC__status_8h}{MFC\_\-status.h} (Defines the Minimum Ionizing Particle (MIP) Filter status bits )}{\pageref{MFC__status_8h}}{}
\item\contentsline{section}{\hyperlink{TOV_8h}{TOV.h} (Tests that any errors in the event are only of the TKR overflow variety )}{\pageref{TOV_8h}}{}
\end{CompactList}
