\hypertarget{dir_4a5dd01c89212721154f9220adc489a9}{
\section{/afs/slac.stanford.edu/g/glast/flight/PHY/source/XFC/V0-3-1/XFC/ Directory Reference}
\label{dir_4a5dd01c89212721154f9220adc489a9}\index{/afs/slac.stanford.edu/g/glast/flight/PHY/source/XFC/V0-3-1/XFC/ Directory Reference@{/afs/slac.stanford.edu/g/glast/flight/PHY/source/XFC/V0-3-1/XFC/ Directory Reference}}
}
\subsection*{Files}
\begin{CompactItemize}
\item 
file \hyperlink{HFC_8h}{HFC.h}
\begin{CompactList}\small\item\em Heavy Ion Filter Code, Interface. \item\end{CompactList}

\item 
file \hyperlink{HFC__cfg_8h}{HFC\_\-cfg.h}
\begin{CompactList}\small\item\em Defines the interface to and data structure containing the parameters used in filtering heavy ions. This is just a front for the most current version. \item\end{CompactList}

\item 
file \hyperlink{HFC__cfgPrint_8h}{HFC\_\-cfgPrint.h}
\begin{CompactList}\small\item\em Prints the contents of the user configuration parameter block. \item\end{CompactList}

\item 
file \hyperlink{HFC__resultsPrint_8h}{HFC\_\-resultsPrint.h}
\begin{CompactList}\small\item\em Defines the interface for summarizing the event-by-event results of the heavy ion (CNO) filtering process. \item\end{CompactList}

\item 
file \hyperlink{HFC__stats_8h}{HFC\_\-stats.h}
\begin{CompactList}\small\item\em Defines the interface for summarizing the event-by-event results of the filtering process into a statistics table. \item\end{CompactList}

\item 
file \hyperlink{HFC__statsPrint_8h}{HFC\_\-statsPrint.h}
\begin{CompactList}\small\item\em Defines the interface for heavy ion statistics print routine. \item\end{CompactList}

\item 
file \hyperlink{HFC__status_8h}{HFC\_\-status.h}
\begin{CompactList}\small\item\em Defines the heavy ion filter status bits. \item\end{CompactList}

\end{CompactItemize}
