\section{File List}
Here is a list of all documented files with brief descriptions:\begin{CompactList}
\item\contentsline{section}{\hyperlink{DFC_8c}{DFC.c} (Diagnostic Filter Code )}{\pageref{DFC_8c}}{}
\item\contentsline{section}{\hyperlink{DFC_8h}{DFC.h} (Diagnostic Filter Code, Interface )}{\pageref{DFC_8h}}{}
\item\contentsline{section}{\hyperlink{DFC__cfg_8h}{DFC\_\-cfg.h} (Defines the interface to and data structure containing the parameters used in diagnostic filter. This is just a front for the most current version of the parameters )}{\pageref{DFC__cfg_8h}}{}
\item\contentsline{section}{\hyperlink{DFC__dbConfigure_8c}{DFC\_\-dbConfigure.c} (Uses an EDS\_\-DB\_\-schema to configure the Diagnostic Filter (DGN) filter )}{\pageref{DFC__dbConfigure_8c}}{}
\item\contentsline{section}{\hyperlink{DFC__def_8h}{DFC\_\-def.h} (Wraps the entire filter context into one structure, suitable for passing to the LCB call back routine )}{\pageref{DFC__def_8h}}{}
\item\contentsline{section}{\hyperlink{DFC__resultDef_8h}{DFC\_\-resultDef.h} (Defines the data structure for summarizing the event-by-event results of the Diagnostic filtering process )}{\pageref{DFC__resultDef_8h}}{}
\item\contentsline{section}{\hyperlink{DFC__stats_8c}{DFC\_\-stats.c} (Provides routines to clear and accumulate and the summary statistics of the Diagnostic filtering process )}{\pageref{DFC__stats_8c}}{}
\item\contentsline{section}{\hyperlink{DFC__stats_8h}{DFC\_\-stats.h} (Defines the interface for summarizing the event-by-event results of the filtering process into a statistics table )}{\pageref{DFC__stats_8h}}{}
\item\contentsline{section}{\hyperlink{DFC__statsDef_8h}{DFC\_\-statsDef.h} (Defines the statistics structure that summarizes the event-by-event results of the Diagnostic filtering process )}{\pageref{DFC__statsDef_8h}}{}
\item\contentsline{section}{\hyperlink{DFC__status_8h}{DFC\_\-status.h} (Defines the Minimum Ionizing Particle (MIP) Filter status bits )}{\pageref{DFC__status_8h}}{}
\end{CompactList}
