\hypertarget{dir_8581d4c1899a1236a26e291868a53b0b}{
\section{/afs/slac.stanford.edu/g/glast/flight/PHY/source/XFC/V0-3-0/src/ Directory Reference}
\label{dir_8581d4c1899a1236a26e291868a53b0b}\index{/afs/slac.stanford.edu/g/glast/flight/PHY/source/XFC/V0-3-0/src/ Directory Reference@{/afs/slac.stanford.edu/g/glast/flight/PHY/source/XFC/V0-3-0/src/ Directory Reference}}
}
\subsection*{Files}
\begin{CompactItemize}
\item 
file \hyperlink{MFC_8c}{MFC.c}
\begin{CompactList}\small\item\em Minimum Ionizing Particle Filter Code. \item\end{CompactList}

\item 
file \hyperlink{MFC__dbConfigure_8c}{MFC\_\-dbConfigure.c}
\begin{CompactList}\small\item\em Uses an EDS\_\-DB\_\-schema to configure the Minimum Ionizing Particle (MIP) filter. \item\end{CompactList}

\item 
file \hyperlink{MFC__def_8h}{MFC\_\-def.h}
\begin{CompactList}\small\item\em Wraps the entire filter context into one structure, suitable for passing to the LCB call back routine. \item\end{CompactList}

\item 
file \hyperlink{MFC__resultDef_8h}{MFC\_\-resultDef.h}
\begin{CompactList}\small\item\em Defines the data structure for summarizing the event-by-event results of the Minimum Ionizig Particle filtering process. \item\end{CompactList}

\item 
file \hyperlink{MFC__stats_8c}{MFC\_\-stats.c}
\begin{CompactList}\small\item\em Provides routines to clear and accumulate and the summary statistics of the Minimum Ionizing Particle filtering process. \item\end{CompactList}

\item 
file \hyperlink{MFC__statsDef_8h}{MFC\_\-statsDef.h}
\begin{CompactList}\small\item\em Defines the statistics structure that summarizes the event-by-event results of the Minimum Ionizing Particle filtering process. \item\end{CompactList}

\end{CompactItemize}
