\hypertarget{struct__MFC}{
\section{\_\-MFC Struct Reference}
\label{struct__MFC}\index{\_\-MFC@{\_\-MFC}}
}
A gathering place for all the information needed to drive the filter.  


{\tt \#include $<$MFC\_\-def.h$>$}

\subsection*{Public Attributes}
\begin{CompactItemize}
\item 
\hyperlink{struct__MFC__cfg}{MFC\_\-cfg} $\ast$ \hyperlink{struct__MFC_8594436dec7b993bb2709ce1ee6df109}{cfg}
\item 
\hyperlink{struct__MfcCtxRestart}{MfcCtxRestart} \hyperlink{struct__MFC_1ad83c4c7f346f8912fd78f86cd6d852}{restart}
\end{CompactItemize}


\subsection{Detailed Description}
A gathering place for all the information needed to drive the filter. 

\subsection{Member Data Documentation}
\hypertarget{struct__MFC_8594436dec7b993bb2709ce1ee6df109}{
\index{\_\-MFC@{\_\-MFC}!cfg@{cfg}}
\index{cfg@{cfg}!_MFC@{\_\-MFC}}
\subsubsection[{cfg}]{\setlength{\rightskip}{0pt plus 5cm}{\bf MFC\_\-cfg}$\ast$ {\bf \_\-MFC::cfg}}}
\label{struct__MFC_8594436dec7b993bb2709ce1ee6df109}


Configuration information \hypertarget{struct__MFC_1ad83c4c7f346f8912fd78f86cd6d852}{
\index{\_\-MFC@{\_\-MFC}!restart@{restart}}
\index{restart@{restart}!_MFC@{\_\-MFC}}
\subsubsection[{restart}]{\setlength{\rightskip}{0pt plus 5cm}{\bf MfcCtxRestart} {\bf \_\-MFC::restart}}}
\label{struct__MFC_1ad83c4c7f346f8912fd78f86cd6d852}


Restart information 

The documentation for this struct was generated from the following file:\begin{CompactItemize}
\item 
\hyperlink{MFC__def_8h}{MFC\_\-def.h}\end{CompactItemize}
