\hypertarget{dir_8581d4c1899a1236a26e291868a53b0b}{
\section{/afs/slac.stanford.edu/g/glast/flight/PHY/source/XFC/V0-3-0/src/ Directory Reference}
\label{dir_8581d4c1899a1236a26e291868a53b0b}\index{/afs/slac.stanford.edu/g/glast/flight/PHY/source/XFC/V0-3-0/src/ Directory Reference@{/afs/slac.stanford.edu/g/glast/flight/PHY/source/XFC/V0-3-0/src/ Directory Reference}}
}
\subsection*{Files}
\begin{CompactItemize}
\item 
file \hyperlink{MFC__cfgPrint_8c}{MFC\_\-cfgPrint.c}
\begin{CompactList}\small\item\em Prints the contents of the user parameter and/or sampling configuration blocks. record. \item\end{CompactList}

\item 
file \hyperlink{MFC__def_8h}{MFC\_\-def.h}
\begin{CompactList}\small\item\em Wraps the entire filter context into one structure, suitable for passing to the LCB call back routine. \item\end{CompactList}

\item 
file \hyperlink{MFC__resultDef_8h}{MFC\_\-resultDef.h}
\begin{CompactList}\small\item\em Defines the data structure for summarizing the event-by-event results of the Minimum Ionizig Particle filtering process. \item\end{CompactList}

\item 
file \hyperlink{MFC__resultsPrint_8c}{MFC\_\-resultsPrint.c}
\begin{CompactList}\small\item\em Provides routines to output the event-by-event Minimum Ionizing Particle filter results vector to a terminal (ASCII). \item\end{CompactList}

\item 
file \hyperlink{MFC__statsDef_8h}{MFC\_\-statsDef.h}
\begin{CompactList}\small\item\em Defines the statistics structure that summarizes the event-by-event results of the Minimum Ionizing Particle filtering process. \item\end{CompactList}

\item 
file \hyperlink{MFC__statsPrint_8c}{MFC\_\-statsPrint.c}
\begin{CompactList}\small\item\em Provides routines to output the summary statistics of the Minimum Ionizing Particle filtering process. \item\end{CompactList}

\end{CompactItemize}
