\hypertarget{dir_ebf9571c531deb6de154f014f4766a25}{
\section{/afs/slac.stanford.edu/g/glast/flight/PHY/source/XFC/V0-2-1/XFC/ Directory Reference}
\label{dir_ebf9571c531deb6de154f014f4766a25}\index{/afs/slac.stanford.edu/g/glast/flight/PHY/source/XFC/V0-2-1/XFC/ Directory Reference@{/afs/slac.stanford.edu/g/glast/flight/PHY/source/XFC/V0-2-1/XFC/ Directory Reference}}
}
\subsection*{Files}
\begin{CompactItemize}
\item 
file \hyperlink{DFC_8h}{DFC.h}
\begin{CompactList}\small\item\em Diagnostic Filter Code, Interface. \item\end{CompactList}

\item 
file \hyperlink{DFC__cfg_8h}{DFC\_\-cfg.h}
\begin{CompactList}\small\item\em Defines the interface to and data structure containing the parameters used in diagnostic filter. This is just a front for the most current version of the parameters. \item\end{CompactList}

\item 
file \hyperlink{DFC__cfgPrint_8h}{DFC\_\-cfgPrint.h}
\begin{CompactList}\small\item\em Prints the contents of the user configuration parameter block. \item\end{CompactList}

\item 
file \hyperlink{DFC__resultsPrint_8h}{DFC\_\-resultsPrint.h}
\begin{CompactList}\small\item\em Defines the interface for summarizing the event-by-event results of the Minimum Ionizing Particle (MIP) filtering process. \item\end{CompactList}

\item 
file \hyperlink{DFC__stats_8h}{DFC\_\-stats.h}
\begin{CompactList}\small\item\em Defines the interface for summarizing the event-by-event results of the filtering process into a statistics table. \item\end{CompactList}

\item 
file \hyperlink{DFC__statsPrint_8h}{DFC\_\-statsPrint.h}
\begin{CompactList}\small\item\em Defines the interface for diagnostic statistics print routine. \item\end{CompactList}

\item 
file \hyperlink{DFC__status_8h}{DFC\_\-status.h}
\begin{CompactList}\small\item\em Defines the Minimum Ionizing Particle (MIP) Filter status bits. \item\end{CompactList}

\end{CompactItemize}
