\section{File List}
Here is a list of all documented files with brief descriptions:\begin{CompactList}
\item\contentsline{section}{\hyperlink{HFC_8c}{HFC.c} (Heavy Ion Filter Code )}{\pageref{HFC_8c}}{}
\item\contentsline{section}{\hyperlink{HFC_8h}{HFC.h} (Heavy Ion Filter Code, Interface )}{\pageref{HFC_8h}}{}
\item\contentsline{section}{\hyperlink{HFC__cfg_8h}{HFC\_\-cfg.h} (Defines the interface to and data structure containing the parameters used in filtering heavy ions. This is just a front for the most current version )}{\pageref{HFC__cfg_8h}}{}
\item\contentsline{section}{\hyperlink{HFC__cfgPrint_8c}{HFC\_\-cfgPrint.c} (Prints the contents of the user parameter and/or sampling configuration blocks. record )}{\pageref{HFC__cfgPrint_8c}}{}
\item\contentsline{section}{\hyperlink{HFC__cfgPrint_8h}{HFC\_\-cfgPrint.h} (Prints the contents of the user configuration parameter block )}{\pageref{HFC__cfgPrint_8h}}{}
\item\contentsline{section}{\hyperlink{HFC__dbConfigure_8c}{HFC\_\-dbConfigure.c} (Uses an EDS\_\-DB\_\-schema to configure the Heavy Ion (CNO) filter )}{\pageref{HFC__dbConfigure_8c}}{}
\item\contentsline{section}{\hyperlink{HFC__def_8h}{HFC\_\-def.h} (Wraps the entire filter context into one structure, suitable for passing to the LCB call back routine )}{\pageref{HFC__def_8h}}{}
\item\contentsline{section}{\hyperlink{HFC__resultDef_8h}{HFC\_\-resultDef.h} (Defines the data structure for summarizing the event-by-event results of the heavy ion filtering process )}{\pageref{HFC__resultDef_8h}}{}
\item\contentsline{section}{\hyperlink{HFC__resultsPrint_8c}{HFC\_\-resultsPrint.c} (Provides routines to output the event-by-event heavy ion results vector to a terminal (ASCII) )}{\pageref{HFC__resultsPrint_8c}}{}
\item\contentsline{section}{\hyperlink{HFC__resultsPrint_8h}{HFC\_\-resultsPrint.h} (Defines the interface for summarizing the event-by-event results of the heavy ion (CNO) filtering process )}{\pageref{HFC__resultsPrint_8h}}{}
\item\contentsline{section}{\hyperlink{HFC__stats_8c}{HFC\_\-stats.c} (Provides routines to clear and accumulate and the summary statistics of the heavy ion filtering process )}{\pageref{HFC__stats_8c}}{}
\item\contentsline{section}{\hyperlink{HFC__stats_8h}{HFC\_\-stats.h} (Defines the interface for summarizing the event-by-event results of the filtering process into a statistics table )}{\pageref{HFC__stats_8h}}{}
\item\contentsline{section}{\hyperlink{HFC__statsDef_8h}{HFC\_\-statsDef.h} (Defines the statistics structure that summarizes the event-by-event results of the heavy ion filtering process )}{\pageref{HFC__statsDef_8h}}{}
\item\contentsline{section}{\hyperlink{HFC__statsPrint_8c}{HFC\_\-statsPrint.c} (Provides routines to output the summary statistics of the filtering process )}{\pageref{HFC__statsPrint_8c}}{}
\item\contentsline{section}{\hyperlink{HFC__statsPrint_8h}{HFC\_\-statsPrint.h} (Defines the interface for heavy ion statistics print routine )}{\pageref{HFC__statsPrint_8h}}{}
\item\contentsline{section}{\hyperlink{HFC__status_8h}{HFC\_\-status.h} (Defines the heavy ion filter status bits )}{\pageref{HFC__status_8h}}{}
\end{CompactList}
