\hypertarget{struct__HfcCfgCal}{
\section{\_\-Hfc\-Cfg\-Cal Struct Reference}
\label{struct__HfcCfgCal}\index{_HfcCfgCal@{\_\-HfcCfgCal}}
}
System control structure for the CAL cuts.  


{\tt \#include $<$HFC\_\-def.h$>$}

\subsection*{Data Fields}
\begin{CompactItemize}
\item 
unsigned int \hyperlink{struct__HfcCfgCal_o0}{ethreshold}
\item 
unsigned int \hyperlink{struct__HfcCfgCal_o1}{nmaxlogs}
\item 
unsigned int \hyperlink{struct__HfcCfgCal_o2}{tolerance}
\end{CompactItemize}


\subsection{Detailed Description}
System control structure for the CAL cuts. 



\subsection{Field Documentation}
\hypertarget{struct__HfcCfgCal_o0}{
\index{_HfcCfgCal@{\_\-Hfc\-Cfg\-Cal}!ethreshold@{ethreshold}}
\index{ethreshold@{ethreshold}!_HfcCfgCal@{\_\-Hfc\-Cfg\-Cal}}
\subsubsection[ethreshold]{\setlength{\rightskip}{0pt plus 5cm}unsigned int \hyperlink{struct__HfcCfgCal_o0}{\_\-Hfc\-Cfg\-Cal::ethreshold}}}
\label{struct__HfcCfgCal_o0}


The threshold, in 2$\ast$LEU, to consider a log hit, The factor of 2 comes from adding each end. Typically 50 Mev =$>$ 400/ \hypertarget{struct__HfcCfgCal_o1}{
\index{_HfcCfgCal@{\_\-Hfc\-Cfg\-Cal}!nmaxlogs@{nmaxlogs}}
\index{nmaxlogs@{nmaxlogs}!_HfcCfgCal@{\_\-Hfc\-Cfg\-Cal}}
\subsubsection[nmaxlogs]{\setlength{\rightskip}{0pt plus 5cm}unsigned int \hyperlink{struct__HfcCfgCal_o1}{\_\-Hfc\-Cfg\-Cal::nmaxlogs}}}
\label{struct__HfcCfgCal_o1}


The maximum number of logs per layer that can be above the the energy threshold, typically, 2. \hypertarget{struct__HfcCfgCal_o2}{
\index{_HfcCfgCal@{\_\-Hfc\-Cfg\-Cal}!tolerance@{tolerance}}
\index{tolerance@{tolerance}!_HfcCfgCal@{\_\-Hfc\-Cfg\-Cal}}
\subsubsection[tolerance]{\setlength{\rightskip}{0pt plus 5cm}unsigned int \hyperlink{struct__HfcCfgCal_o2}{\_\-Hfc\-Cfg\-Cal::tolerance}}}
\label{struct__HfcCfgCal_o2}


The layer-to-layer tolerance, typically 50\%, this is expressed in units of 128, so 1 $\sim$= $\sim$1\%. Typically 30\% 

The documentation for this struct was generated from the following file:\begin{CompactItemize}
\item 
\hyperlink{HFC__def_8h}{HFC\_\-def.h}\end{CompactItemize}
