\hypertarget{dir_000007}{
\section{/afs/slac.stanford.edu/g/glast/flight/PHY/source/XFC/V0-1-2/src/ Directory Reference}
\label{dir_000007}\index{/afs/slac.stanford.edu/g/glast/flight/PHY/source/XFC/V0-1-2/src/ Directory Reference@{/afs/slac.stanford.edu/g/glast/flight/PHY/source/XFC/V0-1-2/src/ Directory Reference}}
}


\begin{figure}[H]
\begin{center}
\leavevmode
\includegraphics[width=61pt]{dir_000007_dep}
\end{center}
\end{figure}
\subsection*{Files}
\begin{CompactItemize}
\item 
file \hyperlink{HFC_8c}{HFC.c}
\begin{CompactList}\small\item\em Heavy Ion Filter Code. \item\end{CompactList}

\item 
file \hyperlink{HFC__dbConfigure_8c}{HFC\_\-db\-Configure.c}
\begin{CompactList}\small\item\em Uses an EDS\_\-DB\_\-schema to configure the Heavy Ion (CNO) filter. \item\end{CompactList}

\item 
file \hyperlink{HFC__def_8h}{HFC\_\-def.h}
\begin{CompactList}\small\item\em Wraps the entire filter context into one structure, suitable for passing to the LCB call back routine. \item\end{CompactList}

\item 
file \hyperlink{HFC__resultDef_8h}{HFC\_\-result\-Def.h}
\begin{CompactList}\small\item\em Defines the data structure for summarizing the event-by-event results of the heavy ion filtering process. \item\end{CompactList}

\item 
file \hyperlink{HFC__stats_8c}{HFC\_\-stats.c}
\begin{CompactList}\small\item\em Provides routines to clear and accumulate and the summary statistics of the heavy ion filtering process. \item\end{CompactList}

\item 
file \hyperlink{HFC__statsDef_8h}{HFC\_\-stats\-Def.h}
\begin{CompactList}\small\item\em Defines the statistics structure that summarizes the event-by-event results of the heavy ion filtering process. \item\end{CompactList}

\end{CompactItemize}
