\hypertarget{struct__MFC}{
\section{\_\-MFC Struct Reference}
\label{struct__MFC}\index{_MFC@{\_\-MFC}}
}
A gathering place for all the information needed to drive the filter.  


{\tt \#include $<$MFC\_\-def.h$>$}

Collaboration diagram for \_\-MFC:\begin{figure}[H]
\begin{center}
\leavevmode
\includegraphics[width=130pt]{struct__MFC__coll__graph}
\end{center}
\end{figure}
\subsection*{Data Fields}
\begin{CompactItemize}
\item 
\hyperlink{struct__MFC__cfg}{MFC\_\-cfg} $\ast$ \hyperlink{struct__MFC_o0}{cfg}
\item 
\hyperlink{struct__MfcCtxRestart}{Mfc\-Ctx\-Restart} \hyperlink{struct__MFC_o1}{restart}
\end{CompactItemize}


\subsection{Detailed Description}
A gathering place for all the information needed to drive the filter. 



\subsection{Field Documentation}
\hypertarget{struct__MFC_o0}{
\index{_MFC@{\_\-MFC}!cfg@{cfg}}
\index{cfg@{cfg}!_MFC@{\_\-MFC}}
\subsubsection[cfg]{\setlength{\rightskip}{0pt plus 5cm}\hyperlink{struct__MFC__cfg}{MFC\_\-cfg}$\ast$ \hyperlink{struct__MFC_o0}{\_\-MFC::cfg}}}
\label{struct__MFC_o0}


Configuration information \hypertarget{struct__MFC_o1}{
\index{_MFC@{\_\-MFC}!restart@{restart}}
\index{restart@{restart}!_MFC@{\_\-MFC}}
\subsubsection[restart]{\setlength{\rightskip}{0pt plus 5cm}\hyperlink{struct__MfcCtxRestart}{Mfc\-Ctx\-Restart} \hyperlink{struct__MFC_o1}{\_\-MFC::restart}}}
\label{struct__MFC_o1}


Restart information 

The documentation for this struct was generated from the following file:\begin{CompactItemize}
\item 
\hyperlink{MFC__def_8h}{MFC\_\-def.h}\end{CompactItemize}
