\section{Data Structures}
Here are the data structures with brief descriptions:\begin{CompactList}
\item\contentsline{section}{\hyperlink{struct__MFC}{\_\-MFC} (A gathering place for all the information needed to drive the filter )}{\pageref{struct__MFC}}{}
\item\contentsline{section}{\hyperlink{struct__MFC__cfg}{\_\-MFC\_\-cfg} (Control structure for the filtering process )}{\pageref{struct__MFC__cfg}}{}
\item\contentsline{section}{\hyperlink{union__MFC__cfgPrms}{\_\-MFC\_\-cfg\-Prms} (Union of all the versions of the configuration parameter structure )}{\pageref{union__MFC__cfgPrms}}{}
\item\contentsline{section}{\hyperlink{struct__MFC__cfgSampler}{\_\-MFC\_\-cfg\-Sampler} (Marries sampler with a tag identifer )}{\pageref{struct__MFC__cfgSampler}}{}
\item\contentsline{section}{\hyperlink{struct__MFC__result}{\_\-MFC\_\-result} (Describes the event-by-event results of the Minimum Ionizing Particle filtering process for the instrumented and development version of the filtering code )}{\pageref{struct__MFC__result}}{}
\item\contentsline{section}{\hyperlink{struct__MFC__stats}{\_\-MFC\_\-stats} (Accumulates the statistics from the event-by-event results of the heavy ion filtering process )}{\pageref{struct__MFC__stats}}{}
\item\contentsline{section}{\hyperlink{struct__MfcCfgCal}{\_\-Mfc\-Cfg\-Cal} (System control structure for the CAL cuts )}{\pageref{struct__MfcCfgCal}}{}
\item\contentsline{section}{\hyperlink{struct__MfcCfgPrms}{\_\-Mfc\-Cfg\-Prms} (Control structure for the filtering process )}{\pageref{struct__MfcCfgPrms}}{}
\item\contentsline{section}{\hyperlink{struct__MfcCfgTkr}{\_\-Mfc\-Cfg\-Tkr} (System control structure for the TKR cuts based on pattern recognition )}{\pageref{struct__MfcCfgTkr}}{}
\item\contentsline{section}{\hyperlink{struct__MfcCtxRestart}{\_\-Mfc\-Ctx\-Restart} (Captures the context needed to pick-up the filtering process when working on an event that spans packets )}{\pageref{struct__MfcCtxRestart}}{}
\end{CompactList}
