\hypertarget{dir_000007}{
\section{/afs/slac.stanford.edu/g/glast/flight/PHY/source/XFC/V0-1-2/src/ Directory Reference}
\label{dir_000007}\index{/afs/slac.stanford.edu/g/glast/flight/PHY/source/XFC/V0-1-2/src/ Directory Reference@{/afs/slac.stanford.edu/g/glast/flight/PHY/source/XFC/V0-1-2/src/ Directory Reference}}
}


\begin{figure}[H]
\begin{center}
\leavevmode
\includegraphics[width=61pt]{dir_000007_dep}
\end{center}
\end{figure}
\subsection*{Files}
\begin{CompactItemize}
\item 
file \hyperlink{MFC_8c}{MFC.c}
\begin{CompactList}\small\item\em Minimum Ionizing Particle Filter Code. \item\end{CompactList}

\item 
file \hyperlink{MFC__cfgPrint_8c}{MFC\_\-cfg\-Print.c}
\begin{CompactList}\small\item\em Prints the contents of the user parameter and/or sampling configuration blocks. record. \item\end{CompactList}

\item 
file \hyperlink{MFC__dbConfigure_8c}{MFC\_\-db\-Configure.c}
\begin{CompactList}\small\item\em Uses an EDS\_\-DB\_\-schema to configure the Minimum Ionizing Particle (MIP) filter. \item\end{CompactList}

\item 
file \hyperlink{MFC__def_8h}{MFC\_\-def.h}
\begin{CompactList}\small\item\em Wraps the entire filter context into one structure, suitable for passing to the LCB call back routine. \item\end{CompactList}

\item 
file \hyperlink{MFC__resultDef_8h}{MFC\_\-result\-Def.h}
\begin{CompactList}\small\item\em Defines the data structure for summarizing the event-by-event results of the Minimum Ionizig Particle filtering process. \item\end{CompactList}

\item 
file \hyperlink{MFC__resultsPrint_8c}{MFC\_\-results\-Print.c}
\begin{CompactList}\small\item\em Provides routines to output the event-by-event Minimum Ionizing Particle filter results vector to a terminal (ASCII). \item\end{CompactList}

\item 
file \hyperlink{MFC__stats_8c}{MFC\_\-stats.c}
\begin{CompactList}\small\item\em Provides routines to clear and accumulate and the summary statistics of the Minimum Ionizing Particle filtering process. \item\end{CompactList}

\item 
file \hyperlink{MFC__statsDef_8h}{MFC\_\-stats\-Def.h}
\begin{CompactList}\small\item\em Defines the statistics structure that summarizes the event-by-event results of the Minimum Ionizing Particle filtering process. \item\end{CompactList}

\item 
file \hyperlink{MFC__statsPrint_8c}{MFC\_\-stats\-Print.c}
\begin{CompactList}\small\item\em Provides routines to output the summary statistics of the Minimum Ionizing Particle filtering process. \item\end{CompactList}

\end{CompactItemize}
