\hypertarget{struct__streamCloseCbp}{
\section{\_\-stream\-Close\-Cbp Struct Reference}
\label{struct__streamCloseCbp}\index{_streamCloseCbp@{\_\-streamCloseCbp}}
}
Structure to bind the close callback routine with a parameter.  


\subsection*{Data Fields}
\begin{CompactItemize}
\item 
\hyperlink{GRB__stream_8c_a3}{stream\-Close} \hyperlink{struct__streamCloseCbp_o0}{rtn}
\item 
void $\ast$ \hyperlink{struct__streamCloseCbp_o1}{prm}
\end{CompactItemize}


\subsection{Detailed Description}
Structure to bind the close callback routine with a parameter. 



\subsection{Field Documentation}
\hypertarget{struct__streamCloseCbp_o1}{
\index{_streamCloseCbp@{\_\-stream\-Close\-Cbp}!prm@{prm}}
\index{prm@{prm}!_streamCloseCbp@{\_\-stream\-Close\-Cbp}}
\subsubsection[prm]{\setlength{\rightskip}{0pt plus 5cm}void$\ast$ \hyperlink{struct__streamCloseCbp_o1}{\_\-stream\-Close\-Cbp::prm}}}
\label{struct__streamCloseCbp_o1}


Parameter to pass to the close routine \hypertarget{struct__streamCloseCbp_o0}{
\index{_streamCloseCbp@{\_\-stream\-Close\-Cbp}!rtn@{rtn}}
\index{rtn@{rtn}!_streamCloseCbp@{\_\-stream\-Close\-Cbp}}
\subsubsection[rtn]{\setlength{\rightskip}{0pt plus 5cm}\hyperlink{GRB__stream_8c_a3}{stream\-Close} \hyperlink{struct__streamCloseCbp_o0}{\_\-stream\-Close\-Cbp::rtn}}}
\label{struct__streamCloseCbp_o0}


The generic close routine 

The documentation for this struct was generated from the following file:\begin{CompactItemize}
\item 
\hyperlink{GRB__stream_8c}{GRB\_\-stream.c}\end{CompactItemize}
