\section{File List}
Here is a list of all documented files with brief descriptions:\begin{CompactList}
\item\contentsline{section}{\hyperlink{GRB_8h}{GRB.h} (Gamma Ray Burst Analysis Code Defines the interface to and data structures containing the parameters used in processing and generating gamma ray burst alerts )}{\pageref{GRB_8h}}{}
\item\contentsline{section}{\hyperlink{GRB__ctl_8c}{GRB\_\-ctl.c} (Gamma Ray Burst Analysis Code GRB control interface )}{\pageref{GRB__ctl_8c}}{}
\item\contentsline{section}{\hyperlink{GRB__p_8h}{GRB\_\-p.h} (Gamma Ray Burst Analysis Code Private definitions for burst handling )}{\pageref{GRB__p_8h}}{}
\item\contentsline{section}{\hyperlink{GRB__sim_8c}{GRB\_\-sim.c} (Gamma Ray Burst Analysis Code GRB detection simulation )}{\pageref{GRB__sim_8c}}{}
\item\contentsline{section}{\hyperlink{GRB__write_8c}{GRB\_\-write.c} (Gamma Ray Burst Analysis Code GRB photon write routines )}{\pageref{GRB__write_8c}}{}
\item\contentsline{section}{\hyperlink{GRB__write_8h}{GRB\_\-write.h} (Gamma Ray Burst Analysis Code Defines the interface to and data structures used in writing photon events )}{\pageref{GRB__write_8h}}{}
\item\contentsline{section}{\hyperlink{GRB__write__p_8h}{GRB\_\-write\_\-p.h} (Gamma Ray Burst Analysis Code Private definitions for a GRB photon writer )}{\pageref{GRB__write__p_8h}}{}
\end{CompactList}
