\section{Data Structures}
Here are the data structures with brief descriptions:\begin{CompactList}
\item\contentsline{section}{\hyperlink{struct__GRB__alertMsg}{\_\-GRB\_\-alert\-Msg} (Structure containing a GRB alert message )}{\pageref{struct__GRB__alertMsg}}{}
\item\contentsline{section}{\hyperlink{struct__GRB__algCtl}{\_\-GRB\_\-alg\-Ctl} (The control structure for the GRB analysis framework )}{\pageref{struct__GRB__algCtl}}{}
\item\contentsline{section}{\hyperlink{struct__GRB__GbmCalc}{\_\-GRB\_\-Gbm\-Calc} (Structure containing a GBM Calc Info message )}{\pageref{struct__GRB__GbmCalc}}{}
\item\contentsline{section}{\hyperlink{struct__GRB__GbmClose}{\_\-GRB\_\-Gbm\-Close} (Structure containing a GBM Close message )}{\pageref{struct__GRB__GbmClose}}{}
\item\contentsline{section}{\hyperlink{struct__GRB__GbmRpt}{\_\-GRB\_\-Gbm\-Rpt} (Structure containing a GBM Repoint message )}{\pageref{struct__GRB__GbmRpt}}{}
\item\contentsline{section}{\hyperlink{struct__GRB__PhotonInfo}{\_\-GRB\_\-Photon\-Info} (Structure containing a information for a GRB photon event )}{\pageref{struct__GRB__PhotonInfo}}{}
\item\contentsline{section}{\hyperlink{struct__GRB__PhotonSummary}{\_\-GRB\_\-Photon\-Summary} (Structure containing a summary of GRB photon events )}{\pageref{struct__GRB__PhotonSummary}}{}
\item\contentsline{section}{\hyperlink{struct__GRB__writeCtl}{\_\-GRB\_\-write\-Ctl} (The GRB photon writer control )}{\pageref{struct__GRB__writeCtl}}{}
\end{CompactList}
