\hypertarget{struct__Prescaler}{
\section{\_\-Prescaler Struct Reference}
\label{struct__Prescaler}\index{\_\-Prescaler@{\_\-Prescaler}}
}
Prescaler control structure.  


\subsection*{Public Attributes}
\begin{CompactItemize}
\item 
unsigned int \hyperlink{struct__Prescaler_9b0a054c798becb0d9aeba03e976bae6}{left}
\item 
unsigned int \hyperlink{struct__Prescaler_8f9663ae7d557e2c0b6f77115cd24d7c}{refresh}
\end{CompactItemize}


\subsection{Detailed Description}
Prescaler control structure. 

\subsection{Member Data Documentation}
\hypertarget{struct__Prescaler_9b0a054c798becb0d9aeba03e976bae6}{
\index{\_\-Prescaler@{\_\-Prescaler}!left@{left}}
\index{left@{left}!_Prescaler@{\_\-Prescaler}}
\subsubsection[{left}]{\setlength{\rightskip}{0pt plus 5cm}unsigned int {\bf \_\-Prescaler::left}}}
\label{struct__Prescaler_9b0a054c798becb0d9aeba03e976bae6}


Number left until prescale expires 

Referenced by AscEdsConstruct(), and AscEdsProcess().\hypertarget{struct__Prescaler_8f9663ae7d557e2c0b6f77115cd24d7c}{
\index{\_\-Prescaler@{\_\-Prescaler}!refresh@{refresh}}
\index{refresh@{refresh}!_Prescaler@{\_\-Prescaler}}
\subsubsection[{refresh}]{\setlength{\rightskip}{0pt plus 5cm}unsigned int {\bf \_\-Prescaler::refresh}}}
\label{struct__Prescaler_8f9663ae7d557e2c0b6f77115cd24d7c}


Refresh count 

Referenced by AscEdsConstruct(), and AscEdsProcess().

The documentation for this struct was generated from the following file:\begin{CompactItemize}
\item 
\hyperlink{ASC__eds_8c}{ASC\_\-eds.c}\end{CompactItemize}
